Center at RA 16 42 07.84851 DEC 68 56 39.7564

CONT: 1642+690 IPOL 8418.771 MHZ 1642+690.ICL001.5

PLot file version 1 created 17-NOV-2004 13:59:34

Cont peak flux = 7.5011E-01 JY/BEAM Levs = 7.501E-01 * (-0.013, 0.013, 0.026, 0.052, 0.103, 0.207, 0.414, 0.828)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50