IF 1- 8 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for OQ208.UVSUB.1

PLot file version 1 created 17-NOV-2004 13:59:01

-95.5 -96.0 -96.5 -97.0

MC-NT-ON

158.0 157.5 157.0 156.5

MC-NT-HH

Degrees

68.0 67.5 67.0 66.5

MC-NT-RO

0 -10 -20

MC-ON-HH

TIME (HOURS)

00 44 46 48 50 52 54

80 60 40 20 0

MC-ON-RO

IF 1- 8 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for OQ208.UVSUB.1

PLot file version 2 created 17-NOV-2004 13:59:01

150 100 50 0 -50

MC-HH-RO

85.5 85.0 84.5 84.0

NT-ON-HH

Degrees

-104.0 -104.5 -105.0 -105.5

NT-ON-RO

97.5 97.0 96.5 96.0

NT-HH-RO