Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 15-NOV-2004 17:45:07

1 JB IF 1R

0.96 0.94 0.92 0.90

1 JB IF 1L

0.97 0.96 0.95 0.94 0.93

1 JB IF 2R

1.00 0.98 0.96 0.94

1 JB IF 2L

1.16

1.14

1.12

1 JB IF 3R

0.98

0.96

0.94 1 JB IF 3L

Gain

0.98

0.96

0.94 1 JB IF 4R

0.99 0.98 0.97 0.96 0.95

1 JB IF 4L

0.95 0.94 0.93 0.92 0.91

2 WB IF 1R

0.915 0.910 0.905 0.900

2 WB IF 1L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

0.92 0.90 0.88 0.86 0.84 0.82

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 15-NOV-2004 17:45:07

2 WB IF 2R

0.98

0.97

0.96

0.95

2 WB IF 2L

1.00

0.98

0.96

2 WB IF 3R

0.940 0.935 0.930 0.925

2 WB IF 3L

0.95 0.94 0.93 0.92

2 WB IF 4R

0.95 0.94 0.93 0.92

2 WB IF 4L

Gain

0.95 0.94 0.93 0.92

3 EF IF 1R

1.00 0.98 0.96 0.94 0.92

3 EF IF 1L

0.98 0.96 0.94 0.92 0.90

3 EF IF 2R

1.00 0.98 0.96 0.94 0.92

3 EF IF 2L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

0.96 0.94 0.92 0.90

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 15-NOV-2004 17:45:07

3 EF IF 3R

0.98 0.96 0.94 0.92 0.90

3 EF IF 3L

0.96 0.94 0.92 0.90 0.88 3 EF IF 4R

0.98 0.96 0.94 0.92 0.90 0.88 3 EF IF 4L

0.96 0.94 0.92 0.90

4 ON IF 1R

0.98 0.96 0.94 0.92 0.90

4 ON IF 1L

Gain

1.08 1.06 1.04 1.02 1.00 4 ON IF 2R

0.96 0.94 0.92 0.90 0.88 0.86 4 ON IF 2L

1.05

1.00

0.95

4 ON IF 3R

1.00

0.95

0.90 4 ON IF 3L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

1.10

1.05

1.00

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 15-NOV-2004 17:45:07

4 ON IF 4R

1.02 1.00 0.98 0.96 0.94 0.92

4 ON IF 4L

1.05

1.00

5 MC IF 1R

1.05 1.00 0.95 0.90

5 MC IF 1L

1.005 1.000 0.995 0.990 5 MC IF 2R

1.05 1.00 0.95 0.90

5 MC IF 2L

Gain

0.95 0.90 0.85 0.80

5 MC IF 3R

1.00 0.95 0.90 0.85

5 MC IF 3L

1.00 0.95 0.90 0.85

5 MC IF 4R

1.00 0.95 0.90 0.85

5 MC IF 4L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

1.00 0.95 0.90 0.85

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 15-NOV-2004 17:45:07

6 TR IF 1R

0.66 0.65 0.64

6 TR IF 1L

0.76 0.74 0.72

6 TR IF 2R

0.68

0.66

0.64

6 TR IF 2L

0.66 0.64 0.62 0.60 0.58

6 TR IF 3R

0.59

0.58

0.57

6 TR IF 3L

Gain

1.35 1.30 1.25 1.20 1.15

6 TR IF 4R

0.640 0.635 0.630 0.625

6 TR IF 4L

0.70 0.68 0.66 0.64 0.62

7 NT IF 1R

0.80

0.75

0.70

7 NT IF 1L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

0.60 0.58 0.56 0.54 0.52

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 15-NOV-2004 17:45:07

7 NT IF 2R

0.62 0.60 0.58 0.56 0.54 0.52

7 NT IF 2L 2.0 1.5 1.0 0.5 7 NT IF 3R

0.62 0.60 0.58 0.56 0.54 0.52

7 NT IF 3L

0.58 0.56 0.54 0.52 0.50 0.48

7 NT IF 4R

0.70

0.65

0.60

7 NT IF 4L

Gain

2.0 1.5 1.0 0.5 8 SC IF 1R

1.10 1.05 1.00 0.95

8 SC IF 1L

1.20

1.15

1.10

8 SC IF 2R 1.0 0.9 0.8 8 SC IF 2L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

1.1 1.0 0.9 0.8

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 7 created 15-NOV-2004 17:45:07

8 SC IF 3R

1.05 1.00 0.95 0.90 0.85

8 SC IF 3L 1.1 1.0 0.9 8 SC IF 4R

1.20 1.15 1.10

8 SC IF 4L

1.15 1.10 1.05 1.00

9 HN IF 1R 1.1 1.0 0.9 9 HN IF 1L

Gain

1.10

1.05

1.00

9 HN IF 2R 1.1 1.0 0.9 0.8 9 HN IF 2L

1.05 1.00 0.95

9 HN IF 3R 1.1 1.0 0.9 0.8 9 HN IF 3L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

1.05 1.00 0.95

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 8 created 15-NOV-2004 17:45:07

9 HN IF 4R 1.1 1.0 0.9 0.8 9 HN IF 4L

1.10 1.05 1.00 0.95

10 NL IF 1R

0.95 0.90 0.85

10 NL IF 1L

0.96 0.94 0.92 0.90

10 NL IF 2R

0.95

0.90

10 NL IF 2L

Gain

1.00 0.98 0.96 0.94 0.92

10 NL IF 3R

1.00 0.95 0.90 0.85

10 NL IF 3L

1.00

0.95

0.90

10 NL IF 4R

1.05 1.00 0.95 0.90 0.85

10 NL IF 4L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

1.05

1.00

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 9 created 15-NOV-2004 17:45:07

12 LA IF 1R

0.95 0.90 0.85 0.80 0.75

12 LA IF 1L 1.0 0.9 0.8 12 LA IF 2R

1.05 1.00 0.95

12 LA IF 2L

1.10 1.05 1.00

12 LA IF 3R 1.1 1.0 0.9 12 LA IF 3L

Gain

1.1 1.0 0.9 12 LA IF 4R 1.1 1.0 0.9 0.8 0.7 12 LA IF 4L 1.1 1.0 0.9 0.8 0.7 13 PT IF 1R

33.455 33.450 33.445 33.440

13 PT IF 1L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

42.110 42.105 42.100 42.095

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 10 created 15-NOV-2004 17:45:07

13 PT IF 2L

59.325 59.320 59.315 59.310

13 PT IF 3R

48.525 48.520 48.515 48.510

13 PT IF 3L

46.320 46.315 46.310 46.305

13 PT IF 4R

39.725 39.720 39.715 39.710

13 PT IF 4L

40.430 40.425 40.420 40.415

16 BR IF 1R

Gain

2.5 2.0 1.5 1.0 0.5 16 BR IF 1L 2.0 1.5 1.0 16 BR IF 2R 1.5 1.0 16 BR IF 2L 1.8 1.6 1.4 1.2 1.0 16 BR IF 3R

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 11 created 15-NOV-2004 17:45:07

16 BR IF 3L 1.6 1.4 1.2 1.0 16 BR IF 4R 1.4 1.2 1.0 0.8 16 BR IF 4L

Gain

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

1.4 1.2 1.0