Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 15-NOV-2004 17:44:44

1 JB IF 1R 3 2 1 0 -1 1 JB IF 1L 2 0 -2 -4 -6 -8 1 JB IF 2R 10 5 0 1 JB IF 2L 0 -20 -40 -60 1 JB IF 3R 10 5 0 1 JB IF 3L

Degrees

0 -20 -40 1 JB IF 4R 3 2 1 0 -1 1 JB IF 4L 0 -20 -40 -60 2 WB IF 1R 0.0 -0.5 -1.0 -1.5 2 WB IF 1L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

20 10 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 15-NOV-2004 17:44:45

2 WB IF 2R 6 4 2 0 2 WB IF 2L 0 -20 -40 -60 2 WB IF 3R 8 6 4 2 0 -2 2 WB IF 3L 0 -20 -40 -60 2 WB IF 4R 1.5 1.0 0.5 0.0 -0.5

2 WB IF 4L

Degrees

0 -20 -40 -60 3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

0.010 0.005 0.000 -0.005

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 15-NOV-2004 17:44:45

3 EF IF 3R

0.010 0.005 0.000 -0.005

3 EF IF 3L

0.010 0.005 0.000 -0.005

3 EF IF 4R

0.010 0.005 0.000 -0.005

3 EF IF 4L

0.010 0.005 0.000 -0.005

4 ON IF 1R 2 0 -2 4 ON IF 1L

Degrees

40 20 0 4 ON IF 2R 6 4 2 0 -2 4 ON IF 2L 0 -20 -40 -60 4 ON IF 3R 10 5 0 4 ON IF 3L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

0 -20 -40

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 15-NOV-2004 17:44:45

4 ON IF 4R 2 1 0 -1 4 ON IF 4L 0 -20 -40 -60 5 MC IF 1R 2 0 -2 5 MC IF 1L 0 -1 -2 -3 5 MC IF 2R 10 5 0 5 MC IF 2L

Degrees

0 -20 -40 -60 5 MC IF 3R 8 6 4 2 0 -2 5 MC IF 3L 0 -20 -40 -60 5 MC IF 4R 4 2 0 -2 5 MC IF 4L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

0 -20 -40 -60

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 15-NOV-2004 17:44:45

6 TR IF 1R 0 -1 -2 -3 6 TR IF 1L 0 -5 -10 6 TR IF 2R 8 6 4 2 0 -2 6 TR IF 2L 0 -20 -40 6 TR IF 3R 10 5 0 6 TR IF 3L

Degrees

0 -20 -40 6 TR IF 4R 1 0 -1 -2 6 TR IF 4L 0 -20 -40 7 NT IF 1R 1 0 -1 7 NT IF 1L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

20 10 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 15-NOV-2004 17:44:45

7 NT IF 2R 6 4 2 0 7 NT IF 2L 4 3 2 1 7 NT IF 3R 10 5 0 7 NT IF 3L 0 -20 -40 7 NT IF 4R 5 4 3 2 1 7 NT IF 4L

Degrees

30 20 10 0 8 SC IF 1R 10 5 0 -5 8 SC IF 1L 15 10 5 0 8 SC IF 2R 15 10 5 0 -5 8 SC IF 2L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

0 -20 -40

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 7 created 15-NOV-2004 17:44:45

8 SC IF 3R 15 10 5 0 -5 8 SC IF 3L 0 -20 -40 8 SC IF 4R 10 5 0 -5 8 SC IF 4L 0 -20 -40 9 HN IF 1R 4 2 0 9 HN IF 1L

Degrees

8 6 4 2 9 HN IF 2R 10 5 0 9 HN IF 2L 60 40 20 0 9 HN IF 3R 10 5 0 9 HN IF 3L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

20 10 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 8 created 15-NOV-2004 17:44:45

9 HN IF 4R 2 0 -2 9 HN IF 4L 30 20 10 0 10 NL IF 1R 2 0 -2 10 NL IF 1L 20 10 0 10 NL IF 2R 2 0 -2 -4 10 NL IF 2L

Degrees

4 2 0 -2 -4 10 NL IF 3R 2 0 -2 -4 10 NL IF 3L 2 0 -2 -4 10 NL IF 4R 3 2 1 0 -1 10 NL IF 4L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

60 40 20 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 9 created 15-NOV-2004 17:44:45

11 FD IF 1L

-56.060 -56.065 -56.070 -56.075

11 FD IF 2L 80 60 40 20 0 -20 11 FD IF 3R

-4.850 -4.855 -4.860 -4.865

11 FD IF 4L

-80.835 -80.840 -80.845 -80.850

12 LA IF 1R 0 -10 -20 -30 12 LA IF 1L

Degrees

40 20 0 12 LA IF 2R 0 -10 -20 -30 12 LA IF 2L 40 20 0 12 LA IF 3R 0 -10 -20 12 LA IF 3L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

40 20 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 10 created 15-NOV-2004 17:44:45

12 LA IF 4R 360 350 340 330 12 LA IF 4L 60 40 20 0 13 PT IF 1R

-125.725 -125.730 -125.735 -125.740 13 PT IF 1L -20 -40 -60 -80 -100

13 PT IF 2R

-96.905 -96.910 -96.915 -96.920

13 PT IF 2L

Degrees

-130.615 -130.620 -130.625 -130.630

13 PT IF 3R

-155.660 -155.665 -155.670 -155.675

13 PT IF 3L

-135.690 -135.695 -135.700 -135.705

13 PT IF 4R

-58.660 -58.665 -58.670 -58.675

13 PT IF 4L

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

-33.145 -33.150 -33.155 -33.160

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 11 created 15-NOV-2004 17:44:45

14 KP IF 1R

-36.920 -36.925 -36.930 -36.935

14 KP IF 1L 200 150 100 50 14 KP IF 2R

78.920 78.915 78.910 78.905

14 KP IF 4L

125.110 125.105 125.100 125.095

15 OV IF 1R

155.690 155.685 155.680 155.675

16 BR IF 1R

Degrees

0 -20 -40 -60 -80 16 BR IF 1L 20 10 0 16 BR IF 2R 100 50 0 16 BR IF 2L 6 4 2 16 BR IF 3R

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

6 4 2 0 -2

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 12 created 15-NOV-2004 17:44:45

16 BR IF 3L 4 2 0 16 BR IF 4R 4 2 0 -2 16 BR IF 4L

Degrees

TIME (HOURS)

22 38 39 40 41 42 43 44 45 46 47

100 50 0