Center at RA 16 42 58.80995 DEC 39 48 36.9939

CONT: 3C345 IPOL 1652.803 MHZ 3C345.IIM001.2

PLot file version 1 created 15-NOV-2004 17:38:10

Cont peak flux = 5.0274E+00 JY/BEAM Levs = 5.027E+00 * (-0.199, 0.199, 0.398, 0.797)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250