Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 15-NOV-2004 17:44:24

1 JB IF 1R

0.98 0.97 0.96 0.95

1 JB IF 1L

1.00 0.98 0.96

1 JB IF 2R

0.99 0.98 0.97 0.96 0.95

1 JB IF 2L

1.18 1.16 1.14 1.12

1 JB IF 3R

0.99 0.98 0.97 0.96 0.95

1 JB IF 3L

Gain

0.98 0.96 0.94

1 JB IF 4R

0.98 0.96 0.94

1 JB IF 4L

0.94 0.92 0.90 0.88

2 WB IF 1R

0.995 0.990 0.985 0.980 2 WB IF 1L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

0.990 0.985 0.980 0.975

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 15-NOV-2004 17:44:24

2 WB IF 2R

1.07 1.06 1.05

2 WB IF 2L

1.070 1.065 1.060 1.055 2 WB IF 3R

1.01

1.00

0.99

2 WB IF 3L

1.01

1.00

0.99

2 WB IF 4R

1.020 1.015 1.010 2 WB IF 4L

Gain

1.020 1.015 1.010

3 EF IF 1R

1.07 1.06 1.05

3 EF IF 1L

1.04 1.03 1.02

3 EF IF 2R

1.055 1.050 1.045 1.040 1.035 3 EF IF 2L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

1.02 1.01 1.00

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 15-NOV-2004 17:44:24

3 EF IF 3R

1.05 1.04 1.03 3 EF IF 3L

1.03 1.02 1.01 3 EF IF 4R

1.03 1.02 1.01 1.00 3 EF IF 4L

1.02 1.01 1.00 4 ON IF 1R 1.2 1.1 1.0 0.9 4 ON IF 1L

Gain

1.3 1.2 1.1 4 ON IF 2R

0.95

0.90

0.85 4 ON IF 2L

1.05 1.00 0.95 4 ON IF 3R

1.00 0.95 0.90 4 ON IF 3L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

1.10 1.05 1.00

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 15-NOV-2004 17:44:24

4 ON IF 4R

1.05 1.00

0.95

4 ON IF 4L

1.10 1.05 1.00

5 MC IF 1R

1.04 1.02 1.00 0.98

5 MC IF 1L

0.98 0.96 0.94 0.92 0.90 5 MC IF 2R

0.96 0.94 0.92 0.90 5 MC IF 2L

Gain

0.94 0.92 0.90 0.88 5 MC IF 3R

0.92 0.90 0.88 0.86 5 MC IF 3L

0.92 0.90 0.88

5 MC IF 4R

0.90 0.88 0.86 5 MC IF 4L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

0.90 0.88 0.86

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 15-NOV-2004 17:44:24

6 TR IF 1R

0.520

0.515

0.510

6 TR IF 1L

0.47 0.46 0.45

6 TR IF 2R

0.466 0.464 0.462 0.460 0.458

6 TR IF 2L

0.48

0.47

0.46

6 TR IF 3R

0.520 0.515 0.510 0.505

6 TR IF 3L

Gain

0.71 0.70 0.69

6 TR IF 4R

0.515 0.510 0.505

6 TR IF 4L

0.49 0.48 0.47

7 NT IF 1R

1.12 1.10 1.08 1.06

7 NT IF 1L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

0.86 0.84 0.82

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 15-NOV-2004 17:44:24

7 NT IF 2R

0.90 0.88 0.86 0.84

7 NT IF 2L

0.88 0.86 0.84

7 NT IF 3R

0.90 0.88 0.86 0.84

7 NT IF 3L

0.88 0.86 0.84 0.82 0.80

7 NT IF 4R

1.05

1.00

0.95

7 NT IF 4L

Gain

0.90

0.85

8 SC IF 1R

0.98

0.96

0.94

8 SC IF 1L

1.10 1.08 1.06 1.04

8 SC IF 2R

1.00 0.98 0.96 0.94

8 SC IF 2L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

1.00 0.98 0.96 0.94

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 7 created 15-NOV-2004 17:44:24

8 SC IF 3R

1.02 1.00 0.98

8 SC IF 3L

1.06 1.04 1.02

8 SC IF 4R

1.08 1.06 1.04 1.02

8 SC IF 4L

1.02 1.00 0.98

9 HN IF 1R

1.00

0.98

0.96

9 HN IF 1L

Gain

1.02

1.00

0.98

9 HN IF 2R

0.97 0.96 0.95 0.94 0.93

9 HN IF 2L

0.96

0.94

0.92

9 HN IF 3R

0.99 0.98 0.97 0.96

9 HN IF 3L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

0.97 0.96 0.95 0.94 0.93

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 8 created 15-NOV-2004 17:44:24

9 HN IF 4R

1.04

1.02

1.00

9 HN IF 4L

1.01 1.00 0.99 0.98 0.97

10 NL IF 1R

1.03

1.02

1.01

10 NL IF 1L

1.01 1.00 0.99

10 NL IF 2R

1.02

1.00

0.98

10 NL IF 2L

Gain

1.04 1.02 1.00

10 NL IF 3R

0.98 0.97 0.96 0.95

10 NL IF 3L

0.98 0.97 0.96 0.95

10 NL IF 4R

0.940 0.935 0.930

10 NL IF 4L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

0.975 0.970 0.965 0.960

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 9 created 15-NOV-2004 17:44:24

11 FD IF 1R

1.06 1.05 1.04

11 FD IF 1L

1.03 1.02 1.01

11 FD IF 2R

1.05 1.00 0.95

11 FD IF 2L

1.05 1.00 0.95

11 FD IF 3R 2.0 1.5 1.0 11 FD IF 3L

Gain

1.00 0.98 0.96

11 FD IF 4R 1.3 1.2 1.1 1.0 0.9 11 FD IF 4L 1.1 1.0 0.9 12 LA IF 1R

1.10 1.05 1.00

12 LA IF 1L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

1.15

1.10

1.05

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 10 created 15-NOV-2004 17:44:24

12 LA IF 2R

1.04 1.02 1.00

12 LA IF 2L

1.06 1.04 1.02

12 LA IF 3R

1.06 1.04 1.02 1.00 0.98

12 LA IF 3L

1.00 0.98 0.96 0.94 0.92

12 LA IF 4R

1.08 1.06 1.04 1.02 1.00 0.98

12 LA IF 4L

Gain

1.02 1.00 0.98

13 PT IF 1R

1.00 0.98 0.96 0.94

13 PT IF 1L

1.02 1.00 0.98 0.96

13 PT IF 2R

1.00

0.98

0.96

13 PT IF 2L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

0.98

0.96

0.94

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 11 created 15-NOV-2004 17:44:24

13 PT IF 3R

1.00 0.98 0.96 0.94 0.92

13 PT IF 3L

1.00 0.98 0.96 0.94

13 PT IF 4R

0.92 0.90 0.88

13 PT IF 4L

1.02 1.00 0.98 0.96

14 KP IF 1R

1.02 1.00 0.98 0.96

14 KP IF 1L

Gain

1.02 1.00 0.98 0.96

14 KP IF 2R

1.035 1.030 1.025 1.020 1.015

14 KP IF 2L

1.015 1.010 1.005 1.000 0.995

14 KP IF 3R

1.00

0.98

0.96

14 KP IF 3L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

0.99 0.98 0.97 0.96 0.95

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 12 created 15-NOV-2004 17:44:24

14 KP IF 4R

1.00 0.98 0.96 0.94

14 KP IF 4L

0.98 0.96 0.94 0.92

15 OV IF 1R

0.97 0.96 0.95 0.94

15 OV IF 1L

1.01 1.00 0.99 0.98

15 OV IF 2R

1.00

0.98

0.96

15 OV IF 2L

Gain

1.02

1.00 0.98

15 OV IF 3R

1.00 0.98 0.96

15 OV IF 3L

1.02 1.00 0.98

15 OV IF 4R

1.00 0.98 0.96

15 OV IF 4L

TIME (HOURS)

18 23 24 25 26 27 28 29 30 31 32

1.00

0.98

0.96