Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 27-SEP-2019 01:59:04

1 AT IF 1R 10 5 0 1 AT IF 1L 8 6 4 2 0 1 AT IF 2R 10 5 0 1 AT IF 2L 10 5 0 1 AT IF 3R 10 5 0 1 AT IF 3L

Degrees

10 5 0 1 AT IF 4R 10 5 0 1 AT IF 4L 10 5 0 1 AT IF 5R 10 5 0 1 AT IF 5L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

10 5 0

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 27-SEP-2019 01:59:04

1 AT IF 6R 10 5 0 1 AT IF 6L 10 5 0 1 AT IF 7R 10 5 0 1 AT IF 7L 8 6 4 2 0 -2 1 AT IF 8R 10 5 0 1 AT IF 8L

Degrees

10 5 0 3 MP IF 1R 10 0 -10 3 MP IF 1L 10 0 -10 3 MP IF 2R 15 10 5 0 -5 3 MP IF 2L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

15 10 5 0 -5

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 27-SEP-2019 01:59:04

3 MP IF 3R 20 10 0 3 MP IF 3L 20 10 0 3 MP IF 4R 20 10 0 3 MP IF 4L 20 10 0 3 MP IF 5R 10 0 -10 3 MP IF 5L

Degrees

10 5 0 -5 3 MP IF 6R 15 10 5 0 3 MP IF 6L 15 10 5 0 -5 3 MP IF 7R 10 5 0 3 MP IF 7L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

15 10 5 0

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 27-SEP-2019 01:59:04

3 MP IF 8R 15 10 5 0 3 MP IF 8L 15 10 5 0 4 HO IF 1R 20 10 0 -10 4 HO IF 1L 10 0 -10 4 HO IF 2R 20 10 0 -10 4 HO IF 2L

Degrees

10 0 -10 4 HO IF 3R 20 10 0 -10 4 HO IF 3L 5 0 -5 -10 4 HO IF 4R 20 10 0 -10 4 HO IF 4L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

10 0 -10

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 27-SEP-2019 01:59:06

4 HO IF 5R 20 10 0 -10 4 HO IF 5L 5 0 -5 -10 4 HO IF 6R 5 0 -5 -10 -15 4 HO IF 6L 5 0 -5 -10 4 HO IF 7R 5 0 -5 -10 -15 4 HO IF 7L

Degrees

5 0 -5 -10 4 HO IF 8R 5 0 -5 -10 4 HO IF 8L 5 0 -5 -10 5 CD IF 1R 15 10 5 0 5 CD IF 1L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

15 10 5 0

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 27-SEP-2019 01:59:06

5 CD IF 2R 15 10 5 0 5 CD IF 2L 15 10 5 0 5 CD IF 3R 15 10 5 0 5 CD IF 3L 15 10 5 0 5 CD IF 4R 10 5 0 5 CD IF 4L

Degrees

15 10 5 0 5 CD IF 5R 15 10 5 0 -5 5 CD IF 5L 15 10 5 0 5 CD IF 6R 10 5 0 -5 5 CD IF 6L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

10 5 0 -5

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 27-SEP-2019 01:59:06

5 CD IF 7R 5 0 -5 5 CD IF 7L 10 5 0 -5 5 CD IF 8R 5 0 5 CD IF 8L 5 0 -5 7 YG IF 1R -10 -11 -12 7 YG IF 1L

Degrees

-8 -9 -10 -11 7 YG IF 2R

-8.3 -8.4 -8.5

7 YG IF 2L -7 -8 -9 -10 7 YG IF 3R -8 -9 -10 -11 7 YG IF 3L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

-7 -8 -9 -10

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 27-SEP-2019 01:59:06

7 YG IF 4R -8 -10 -12 7 YG IF 4L -6 -8 -10 7 YG IF 5R 354 352 350 7 YG IF 5L 354 352 350 7 YG IF 6R 354 352 350 7 YG IF 6L

Degrees

-5 -6 -7 -8 -9 7 YG IF 7R 355 354 353 352 351 7 YG IF 7L -6 -7 -8 7 YG IF 8R -4 -5 -6 -7 7 YG IF 8L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

-4 -5 -6

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 27-SEP-2019 01:59:06

8 KE IF 1R 15 10 5 8 KE IF 1L 15 10 5 8 KE IF 2R 15 10 5 8 KE IF 2L 15 10 5 8 KE IF 3R 20 15 10 5 8 KE IF 3L

Degrees

20 15 10 5 8 KE IF 4R 20 15 10 5 8 KE IF 4L 20 15 10 5 8 KE IF 5R 20 15 10 5 8 KE IF 5L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

20 15 10 5

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 27-SEP-2019 01:59:06

8 KE IF 6R 20 15 10 5 8 KE IF 6L 15 10 5 8 KE IF 7R 15 10 5 8 KE IF 7L 15 10 5 8 KE IF 8R 15 10 5 8 KE IF 8L

Degrees

15 10 5 10 TI IF 1R

73.6315 73.6310 73.6305 73.6300

10 TI IF 1L

71.9910 71.9905 71.9900 71.9895

10 TI IF 2R

75.4545 75.4540 75.4535 75.4530

10 TI IF 2L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

74.6490 74.6485 74.6480 74.6475

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 27-SEP-2019 01:59:06

10 TI IF 3R

71.6685 71.6680 71.6675 71.6670

10 TI IF 3L

68.0485 68.0480 68.0475 68.0470

10 TI IF 4L

75.7530 75.7525 75.7520 75.7515

10 TI IF 5R

68.4615 68.4610 68.4605 68.4600

10 TI IF 5L 80 60 40 20 0 -20 10 TI IF 6R

Degrees

65.4275 65.4270 65.4265 65.4260 65.4255

10 TI IF 6L

64.7320 64.7315 64.7310 64.7305

10 TI IF 7R

-44.2215 -44.2220 -44.2225 -44.2230

10 TI IF 8R

-50.312

-50.313

-50.314

10 TI IF 8L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

-47.1225 -47.1230 -47.1235 -47.1240

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 12 created 27-SEP-2019 01:59:06

11 HH IF 1R 10 5 0 11 HH IF 1L 15 10 5 0 11 HH IF 2R 8 6 4 2 11 HH IF 2L 10 5 11 HH IF 3R 10 8 6 4 2 11 HH IF 3L

Degrees

10 5 0 11 HH IF 4R 10 5 0 11 HH IF 4L 15 10 5 0 11 HH IF 5R 10 5 0 11 HH IF 5L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

15 10 5 0

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 15 created 27-SEP-2019 01:59:06

13 MC IF 1L 10 5 0 13 MC IF 2R 15 10 5 0 13 MC IF 2L 15 10 5 0 -5 13 MC IF 3R 15 10 5 0 -5 13 MC IF 3L 10 5 0 -5 13 MC IF 4R

Degrees

15 10 5 0 -5 13 MC IF 4L 10 5 0 13 MC IF 5R 15 10 5 0 13 MC IF 5L 20 10 0 13 MC IF 6R

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

15 10 5 0

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 16 created 27-SEP-2019 01:59:06

13 MC IF 6L 15 10 5 0 13 MC IF 7R 15 10 5 0 13 MC IF 7L 15 10 5 0 13 MC IF 8R 5 0 13 MC IF 8L 15 10 5 0 -5 14 YS IF 1R

Degrees

358 356 354 352 14 YS IF 1L 358 356 354 352 14 YS IF 2R 0 -2 -4 -6 -8 14 YS IF 2L 358 356 354 14 YS IF 3R

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

2 0 -2 -4 -6

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 17 created 27-SEP-2019 01:59:06

14 YS IF 3L 0 -2 -4 -6 -8 14 YS IF 4R 2 0 -2 -4 -6 -8 14 YS IF 4L 2 0 -2 -4 -6 -8 14 YS IF 5R 2 0 -2 -4 -6 -8 14 YS IF 5L 2 0 -2 -4 -6 -8 14 YS IF 6R

Degrees

0 -2 -4 -6 -8 14 YS IF 6L 360 355 350 14 YS IF 7R 0 -2 -4 -6 -8 14 YS IF 7L 358 356 354 352 350 14 YS IF 8R

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

358 356 354 352

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 18 created 27-SEP-2019 01:59:06

14 YS IF 8L -2 -4 -6 -8 -10 15 T6 IF 1R 10 5 0 -5 15 T6 IF 1L 5 0 15 T6 IF 2R 10 5 0 -5 15 T6 IF 2L 10 5 0 15 T6 IF 3R

Degrees

10 5 0 -5 15 T6 IF 3L 15 10 5 0 -5 15 T6 IF 4R 10 5 0 -5 15 T6 IF 4L 10 5 0 -5 15 T6 IF 5R

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

10 5 0 -5

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 19 created 27-SEP-2019 01:59:06

15 T6 IF 5L 15 10 5 0 -5 15 T6 IF 6R 10 5 0 -5 15 T6 IF 6L 15 10 5 0 -5 15 T6 IF 7R 10 5 0 -5 15 T6 IF 7L 10 5 0 -5 15 T6 IF 8R

Degrees

10 5 0 -5 15 T6 IF 8L 10 5 0 -5 20 O6 IF 1R 20 10 0 -10 20 O6 IF 1L 20 10 0 -10 20 O6 IF 2R

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

20 10 0

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 20 created 27-SEP-2019 01:59:06

20 O6 IF 2L 20 10 0 -10 20 O6 IF 3R 20 10 0 -10 20 O6 IF 3L 20 10 0 -10 20 O6 IF 4R 20 10 0 -10 20 O6 IF 4L 20 10 0 -10 20 O6 IF 5R

Degrees

20 10 0 -10 20 O6 IF 5L 20 10 0 -10 20 O6 IF 6R 20 10 0 -10 20 O6 IF 6L 20 10 0 -10 20 O6 IF 7R

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

20 10 0 -10

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 21 created 27-SEP-2019 01:59:06

20 O6 IF 7L 20 10 0 -10 20 O6 IF 8R 20 10 0 -10 20 O6 IF 8L 20 10 0 -10 21 EF IF 1R

0.001

0.000

-0.001

21 EF IF 1L

0.001

0.000

-0.001

21 EF IF 2R

Degrees

0.001

0.000

-0.001

21 EF IF 2L

0.001

0.000

-0.001

21 EF IF 3R

0.001

0.000

-0.001

21 EF IF 3L

0.001

0.000

-0.001

21 EF IF 4R

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

0.001

0.000

-0.001

Gain phs vs UTC time for J1256-0547.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 22 created 27-SEP-2019 01:59:06

21 EF IF 4L

0.001 0.000 -0.001

21 EF IF 5R

0.001 0.000 -0.001

21 EF IF 5L

0.001 0.000 -0.001

21 EF IF 6R

0.001 0.000 -0.001

21 EF IF 6L

0.001 0.000 -0.001

21 EF IF 7R

Degrees

0.001 0.000 -0.001

21 EF IF 7L

0.001 0.000 -0.001

21 EF IF 8R

0.001 0.000 -0.001

21 EF IF 8L

Time (hours)

20 1/00 1/04 1/08 1/12 1/16 1/20 2/00 2/04 2/08 2/12 2/16 2/20 3/00

0.001 0.000 -0.001