Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 27-SEP-2019 01:59:48

1 AT IF 1R 100 0 -100

1 AT IF 1L 200 100 0 -100 1 AT IF 2R 100 0 -100

1 AT IF 2L 100 0 -100

1 AT IF 3R 100 0 -100

1 AT IF 3L

Degrees

100 0 -100

1 AT IF 4R 200 0 -200 1 AT IF 4L 100 0 -100 1 AT IF 5R 100 0 -100 1 AT IF 5L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 27-SEP-2019 01:59:48

1 AT IF 6R 100 0 -100 1 AT IF 6L 100 0 -100 -200 1 AT IF 7R 100 0 -100

1 AT IF 7L 100 0 -100

1 AT IF 8R 200 100 0 -100

1 AT IF 8L

Degrees

100 0 -100

2 PA IF 1R 100 0 -100

2 PA IF 1L 200 100 0 -100 2 PA IF 2R 100 0 -100

2 PA IF 2L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 27-SEP-2019 01:59:48

2 PA IF 3R 100 0 -100

2 PA IF 3L 100 0 -100 -200 2 PA IF 4R 200 100 0 -100 2 PA IF 4L 100 0 -100

2 PA IF 5R 100 0 -100 2 PA IF 5L

Degrees

100 0 -100 -200 2 PA IF 6R 200 100 0 -100

2 PA IF 6L 100 0 -100

2 PA IF 7R 100 0 -100

2 PA IF 7L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 0 -200

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 27-SEP-2019 01:59:48

2 PA IF 8R 200 100 0 -100

2 PA IF 8L 100 0 -100

3 MP IF 1R 100 0 -100

3 MP IF 1L 100 0 -100

3 MP IF 2R 100 0 -100

3 MP IF 2L

Degrees

100 0 -100

3 MP IF 3R 100 0 -100

3 MP IF 3L 100 0 -100

3 MP IF 4R 200 0 -200

3 MP IF 4L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 27-SEP-2019 01:59:48

3 MP IF 5R 100 0 -100

3 MP IF 5L 50 0 -50 -100

3 MP IF 6R 200 100 0 -100

3 MP IF 6L 200 0 -200

3 MP IF 7R 100 0 -100

3 MP IF 7L

Degrees

100 0 -100

3 MP IF 8R 200 0 -200

3 MP IF 8L 100 0 -100

4 HO IF 1R 100 0 -100

4 HO IF 1L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 27-SEP-2019 01:59:48

4 HO IF 2R 100 0 -100

4 HO IF 2L 50 0 -50 -100 -150

4 HO IF 3R 100 0 -100

4 HO IF 3L 200 0 -200

4 HO IF 4R 200 100 0 -100

4 HO IF 4L

Degrees

200 0 -200

4 HO IF 5R 100 0 -100

4 HO IF 5L 100 0 -100

4 HO IF 6R 100 0 -100

4 HO IF 6L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 27-SEP-2019 01:59:48

4 HO IF 7R 100 0 -100

4 HO IF 7L 150 100 50 0 -50 4 HO IF 8R 100 0 -100 -200

4 HO IF 8L 100 0 -100

5 CD IF 1R 50 0 -50 -100

5 CD IF 1L

Degrees

100 0 -100

5 CD IF 2R 100 0 -100

5 CD IF 2L 200 100 0 -100

5 CD IF 3R 200 100 0 -100

5 CD IF 3L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 27-SEP-2019 01:59:48

5 CD IF 4R 100 0 -100

5 CD IF 4L 100 0 -100

5 CD IF 5R 100 0 -100

5 CD IF 5L 200 0 -200

5 CD IF 6R 200 100 0 -100

5 CD IF 6L

Degrees

200 0 -200

5 CD IF 7R 100 0 -100

5 CD IF 7L 200 100 0 -100

5 CD IF 8R 200 100 0 -100

5 CD IF 8L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 27-SEP-2019 01:59:48

6 WA IF 1R 100 0 -100

6 WA IF 1L 200 100 0 -100

6 WA IF 2R 100 0 -100

6 WA IF 2L 200 100 0 -100

6 WA IF 3R 100 0 -100 -200

6 WA IF 3L

Degrees

100 0 -100

6 WA IF 4R 200 100 0 -100

6 WA IF 4L 200 0 -200

6 WA IF 5R 100 0 -100

6 WA IF 5L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 27-SEP-2019 01:59:48

6 WA IF 6R 100 0 -100

6 WA IF 6L 100 0 -100

6 WA IF 7R 100 0 -100

6 WA IF 7L 100 0 -100

6 WA IF 8R 200 0 -200

6 WA IF 8L

Degrees

100 0 -100

7 YG IF 1R 200 100 0 -100

7 YG IF 1L 100 0 -100

7 YG IF 2R 100 0 -100

7 YG IF 2L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 27-SEP-2019 01:59:48

7 YG IF 3R 100 0 -100

7 YG IF 3L 100 0 -100

7 YG IF 4R 200 100 0 -100

7 YG IF 4L 100 0 -100

7 YG IF 5R 50 0 -50 -100

7 YG IF 5L

Degrees

100 0 -100

7 YG IF 6R 100 0 -100

7 YG IF 6L 100 0 -100

7 YG IF 7R 100 0 -100

7 YG IF 7L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 12 created 27-SEP-2019 01:59:48

7 YG IF 8R 100 0 -100 -200

7 YG IF 8L 100 0 -100

8 KE IF 1R 50 0 -50 -100 -150

8 KE IF 1L 100 0 -100

8 KE IF 2R 50 0 -50 -100

8 KE IF 2L

Degrees

100 0 -100

8 KE IF 3R 100 0 -100

8 KE IF 3L 100 0 -100

8 KE IF 4R 100 0 -100

8 KE IF 4L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 15 created 27-SEP-2019 01:59:48

10 TI IF 7R 150 100 50 0 10 TI IF 7L 100 50 0 10 TI IF 8R 150 100 50 0 -50 10 TI IF 8L 0 -50 -100 -150 11 HH IF 1R 100 0 -100

11 HH IF 1L

Degrees

200 100 0 -100

11 HH IF 2R 200 0 -200 11 HH IF 2L 100 0 -100 -200 11 HH IF 3R 150 100 50 0 -50 11 HH IF 3L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 16 created 27-SEP-2019 01:59:48

11 HH IF 4R 100 0 -100 11 HH IF 4L 200 100 0 -100

11 HH IF 5R 150 100 50 0 -50 11 HH IF 5L 100 0 -100 -200 11 HH IF 6R 100 0 -100 -200 11 HH IF 6L

Degrees

100 0 -100

11 HH IF 7R 100 0 -100

11 HH IF 7L 100 0 -100 11 HH IF 8R 100 0 -100 11 HH IF 8L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 17 created 27-SEP-2019 01:59:48

12 WB IF 1R 150 100 12 WB IF 1L

66.3740 66.3735 66.3730 66.3725

12 WB IF 2R

64.7625 64.7620 64.7615 64.7610

12 WB IF 2L

-19.492

-19.493

-19.494 12 WB IF 3R 40 30 20 10 12 WB IF 3L

Degrees

150 100 50 0 12 WB IF 4R 355 350 345 340 335 12 WB IF 4L 100 0 -100

12 WB IF 5R 100 50 0 12 WB IF 5L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 50 0 -50

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 18 created 27-SEP-2019 01:59:48

12 WB IF 6R 100 0 -100 -200 12 WB IF 6L 100 0 -100

12 WB IF 7R 200 0 -200 12 WB IF 7L 50 0 -50 -100 -150 12 WB IF 8R 200 0 -200 12 WB IF 8L

Degrees

200 100 0 -100 13 MC IF 1R 200 100 0 -100 13 MC IF 1L 200 100 0 13 MC IF 2R 100 0 -100 13 MC IF 2L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 19 created 27-SEP-2019 01:59:48

13 MC IF 3R 100 0 -100 -200

13 MC IF 3L 100 0 -100

13 MC IF 4R 100 0 -100

13 MC IF 4L 100 50 0 -50 13 MC IF 5R 100 0 -100

13 MC IF 5L

Degrees

150 100 50 0 -50 13 MC IF 6R 100 0 -100 -200

13 MC IF 6L 200 100 0 13 MC IF 7R 100 0 -100

13 MC IF 7L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 20 created 27-SEP-2019 01:59:48

13 MC IF 8R 50 0 -50 13 MC IF 8L 150 100 50 0 -50 14 YS IF 1R 100 0 -100 -200

14 YS IF 1L 100 0 -100

14 YS IF 2R 100 0 -100

14 YS IF 2L

Degrees

100 0 -100

14 YS IF 3R 100 0 -100

14 YS IF 3L 100 0 -100

14 YS IF 4R 100 0 -100 -200

14 YS IF 4L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 21 created 27-SEP-2019 01:59:48

14 YS IF 5R 100 0 -100

14 YS IF 5L 100 0 -100

14 YS IF 6R 200 100 0 -100

14 YS IF 6L 200 0 -200

14 YS IF 7R 100 0 -100

14 YS IF 7L

Degrees

100 0 -100 -200

14 YS IF 8R 100 0 -100

14 YS IF 8L 100 0 -100

15 T6 IF 1R 100 0 -100

15 T6 IF 1L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 22 created 27-SEP-2019 01:59:48

15 T6 IF 2R 100 0 -100

15 T6 IF 2L 100 0 -100

15 T6 IF 3R 100 0 -100

15 T6 IF 3L 200 0 -200

15 T6 IF 4R 100 0 -100

15 T6 IF 4L

Degrees

0 -50 -100

15 T6 IF 5R 100 0 -100

15 T6 IF 5L 100 0 -100

15 T6 IF 6R 50 0 -50 -100 -150

15 T6 IF 6L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 23 created 27-SEP-2019 01:59:48

15 T6 IF 7R 100 0 -100

15 T6 IF 7L 100 0 -100

15 T6 IF 8R 100 0 -100 -200

15 T6 IF 8L 200 100 0 -100

17 SV IF 1R 100 0 -100

17 SV IF 1L

Degrees

100 0 -100

17 SV IF 2R 50 0 -50 -100

17 SV IF 2L 100 0 -100 -200

17 SV IF 3R 50 0 -50 -100

17 SV IF 3L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

150 100 50 0 -50

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 24 created 27-SEP-2019 01:59:48

17 SV IF 4R 100 0 -100

17 SV IF 4L 20 0 -20 17 SV IF 5R 0 -50 -100

17 SV IF 5L 200 100 0 -100

17 SV IF 6R 20 0 -20 -40 -60 -80 17 SV IF 6L

Degrees

100 0 -100

17 SV IF 7R 100 0 -100

17 SV IF 7L 0 -50 -100 -150

17 SV IF 8R 200 100 0 -100

17 SV IF 8L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

20 0 -20

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 25 created 27-SEP-2019 01:59:48

18 ZC IF 1R 100 0 -100

18 ZC IF 1L 150 100 50 0 18 ZC IF 2R 100 0 -100

18 ZC IF 2L 100 0 -100

18 ZC IF 3R 0 -50 -100 -150

18 ZC IF 3L

Degrees

200 100 0 -100

18 ZC IF 4R 150 100 50 0 -50 18 ZC IF 4L 40 20 0 -20 -40 18 ZC IF 5R 200 100 0 -100

18 ZC IF 5L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 26 created 27-SEP-2019 01:59:48

18 ZC IF 6R 100 0 -100

18 ZC IF 6L 150 100 50 0 -50 18 ZC IF 7R 100 0 -100

18 ZC IF 7L 100 0 -100

18 ZC IF 8R 150 100 50 0 -50 18 ZC IF 8L

Degrees

100 50 0 19 BD IF 1R 100 0 -100

19 BD IF 1L 200 100 0 -100

19 BD IF 2R 100 0 -100

19 BD IF 2L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 0 -200

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 27 created 27-SEP-2019 01:59:48

19 BD IF 3R 100 0 -100

19 BD IF 3L 100 0 -100

19 BD IF 4R 100 0 -100

19 BD IF 4L 100 0 -100

19 BD IF 5R 100 0 -100

19 BD IF 5L

Degrees

100 0 -100

19 BD IF 6R 50 0 -50 -100 -150

19 BD IF 6L 100 0 -100

19 BD IF 7R 100 0 -100

19 BD IF 7L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 30 created 27-SEP-2019 01:59:48

21 EF IF 2R

0.001 0.000 -0.001 21 EF IF 2L

0.001 0.000 -0.001 21 EF IF 3R

0.001 0.000 -0.001 21 EF IF 3L

0.001 0.000 -0.001 21 EF IF 4R

0.001 0.000 -0.001 21 EF IF 4L

Degrees

0.001 0.000 -0.001 21 EF IF 5R

0.001 0.000 -0.001 21 EF IF 5L

0.001 0.000 -0.001 21 EF IF 6R

0.001 0.000 -0.001 21 EF IF 6L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

0.001 0.000 -0.001

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 31 created 27-SEP-2019 01:59:48

21 EF IF 7R

0.001

0.000

-0.001 21 EF IF 7L

0.001

0.000

-0.001 21 EF IF 8R

0.001

0.000

-0.001 21 EF IF 8L

0.001

0.000

-0.001 22 SC IF 1R 100 0 -100 -200 22 SC IF 1L

Degrees

100 0 -100

22 SC IF 2R 100 0 -100

22 SC IF 2L 100 0 -100

22 SC IF 3R 200 100 0 -100 22 SC IF 3L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 32 created 27-SEP-2019 01:59:48

22 SC IF 4R 100 0 -100

22 SC IF 4L 100 0 -100 22 SC IF 5R 100 0 -100 22 SC IF 5L 100 0 -100

22 SC IF 6R 100 0 -100

22 SC IF 6L

Degrees

100 0 -100

22 SC IF 7R 100 0 -100 22 SC IF 7L 200 0 -200 22 SC IF 8R 100 50 0 -50 22 SC IF 8L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 33 created 27-SEP-2019 01:59:48

23 HN IF 1R 100 0 -100 23 HN IF 1L 100 0 -100 23 HN IF 2R 100 0 -100 23 HN IF 2L 150 100 50 0 -50 23 HN IF 3R 150 100 50 0 -50 23 HN IF 3L

Degrees

100 0 -100 23 HN IF 4R 100 0 -100

23 HN IF 4L 100 50 0 -50 23 HN IF 5R 100 0 -100

23 HN IF 5L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

200 100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 34 created 27-SEP-2019 01:59:48

23 HN IF 6R 50 0 -50 -100 -150

23 HN IF 6L 100 0 -100 -200

23 HN IF 7R 100 0 -100

23 HN IF 7L 100 0 -100

23 HN IF 8R 50 0 -50 -100 -150

23 HN IF 8L

Degrees

200 100 0 -100

24 NL IF 1R 100 0 -100

24 NL IF 1L 100 0 -100

24 NL IF 2R 100 0 -100

24 NL IF 2L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 35 created 27-SEP-2019 01:59:48

24 NL IF 3R 100 50 0 -50 24 NL IF 3L 100 0 -100

24 NL IF 4R 100 0 -100

24 NL IF 4L 100 0 -100

24 NL IF 5R 150 100 50 0 -50 24 NL IF 5L

Degrees

100 0 -100

24 NL IF 6R 100 0 -100

24 NL IF 6L 100 0 -100

24 NL IF 7R 100 0 -100

24 NL IF 7L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 36 created 27-SEP-2019 01:59:48

24 NL IF 8R 200 100 0 -100

24 NL IF 8L 150 100 50 0 25 FD IF 1R 200 100 0 -100

25 FD IF 1L 200 0 -200

25 FD IF 2R 200 100 0 -100

25 FD IF 2L

Degrees

100 0 -100

25 FD IF 3R 150 100 50 0 -50 25 FD IF 3L 100 0 -100

25 FD IF 4R 100 0 -100

25 FD IF 4L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 37 created 27-SEP-2019 01:59:48

25 FD IF 5R 200 100 0 -100

25 FD IF 5L 100 0 -100

25 FD IF 6R 100 0 -100

25 FD IF 6L 100 0 -100

25 FD IF 7R 100 0 -100

25 FD IF 7L

Degrees

50 0 -50 -100 -150

25 FD IF 8R 100 0 -100

25 FD IF 8L 100 0 -100

26 LA IF 1R 100 0 -100

26 LA IF 1L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

0 -50 -100 -150

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 38 created 27-SEP-2019 01:59:48

26 LA IF 2R 100 0 -100

26 LA IF 2L 40 20 0 -20 26 LA IF 3R 100 0 -100

26 LA IF 3L 100 0 -100

26 LA IF 4R 100 50 0 -50 26 LA IF 4L

Degrees

50 0 -50 -100

26 LA IF 5R 100 0 -100

26 LA IF 5L 150 100 50 0 26 LA IF 6R 0 -100 -200

26 LA IF 6L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

20 0 -20

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 39 created 27-SEP-2019 01:59:48

26 LA IF 7R 50 0 26 LA IF 7L 0 -50 -100 -150

26 LA IF 8R 100 0 -100

26 LA IF 8L 100 0 -100

27 PT IF 1R 100 0 -100

27 PT IF 1L

Degrees

200 0 -200

27 PT IF 2R 100 0 -100

27 PT IF 2L 100 0 -100

27 PT IF 3R 100 0 -100

27 PT IF 3L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

0 -50 -100 -150

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 40 created 27-SEP-2019 01:59:48

27 PT IF 4R 100 0 -100

27 PT IF 4L 50 0 -50 -100

27 PT IF 5R 100 0 -100

27 PT IF 5L 100 0 -100

27 PT IF 6R 100 0 -100

27 PT IF 6L

Degrees

200 0 -200

27 PT IF 7R 50 0 -50 27 PT IF 7L 100 0 -100

27 PT IF 8R 150 100 50 0 -50 27 PT IF 8L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 41 created 27-SEP-2019 01:59:48

29 OV IF 1R 100 0 -100

29 OV IF 1L 50 0 -50 -100 -150

29 OV IF 2R 100 0 -100

29 OV IF 2L 100 0 -100

29 OV IF 3R 150 100 50 0 -50 29 OV IF 3L

Degrees

100 0 -100

29 OV IF 4R 200 0 -200

29 OV IF 4L 100 0 -100

29 OV IF 5R 100 0 -100

29 OV IF 5L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 42 created 27-SEP-2019 01:59:48

29 OV IF 6R 200 100 0 -100

29 OV IF 6L 150 100 50 0 29 OV IF 7R 100 0 -100

29 OV IF 7L 100 0 -100

29 OV IF 8R 100 0 -100

29 OV IF 8L

Degrees

100 50 0 30 BR IF 1R 100 0 -100

30 BR IF 1L 50 0 -50 30 BR IF 2R 50 0 -50 -100

30 BR IF 2L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100

Gain phs vs UTC time for J1628-1415.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 45 created 27-SEP-2019 01:59:48

31 MK IF 5R 100 0 -100

31 MK IF 5L 100 0 -100 31 MK IF 6R 200 100 0 31 MK IF 6L 100 0 -100 31 MK IF 7R 100 0 -100 31 MK IF 7L

Degrees

100 0 -100

31 MK IF 8R 100 0 -100

31 MK IF 8L

Time (hours)

08 16 1/00 1/08 1/16 2/00 2/08 2/16 3/00 3/08 3/16 4/00

100 0 -100