Center at RA 01 11 37.31698 DEC 39 06 28.1043

CONT: 0108+388 IPOL 8420.302 MHZ 0108+388.ICL001.3

PLot file version 1 created 08-DEC-2002 15:10:19

Cont peak flux = 2.3720E-01 JY/BEAM Levs = 2.372E-01 * (-0.023, 0.023, 0.046, 0.092, 0.185, 0.370, 0.740)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50