Center at RA 18 45 35.10887 DEC 35 41 16.7265

CONT: 1843+356 IPOL 8420.302 MHZ 1843+356.ICL001.3

PLot file version 1 created 08-DEC-2002 15:25:25

Cont peak flux = 1.2341E-01 JY/BEAM Levs = 1.234E-01 * (-0.035, 0.035, 0.069, 0.138, 0.276, 0.552)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50