Center at RA 19 44 31.51262 DEC 54 48 07.0631

CONT: 1943+546 IPOL 8420.302 MHZ 1943+546.ICL001.3

PLot file version 1 created 08-DEC-2002 16:13:05

Cont peak flux = 2.2434E-01 JY/BEAM Levs = 2.243E-01 * (-0.014, 0.014, 0.028, 0.056, 0.112, 0.224, 0.449, 0.898)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50