Center at RA 20 02 10.41830 DEC 47 25 28.7770

CONT: 2002+475 IPOL 8420.302 MHZ 2002+475.ICL001.3

PLot file version 1 created 08-DEC-2002 15:08:12

Cont peak flux = 5.8016E-01 JY/BEAM Levs = 5.802E-01 * (-0.010, 0.010, 0.021, 0.041, 0.083, 0.165, 0.331, 0.662)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50