Center at RA 20 22 06.68168 DEC 61 36 58.8047

CONT: 2021+614 IPOL 8420.302 MHZ 2021+614.ICL001.3

PLot file version 1 created 08-DEC-2002 16:15:54

Cont peak flux = 1.9058E+00 JY/BEAM Levs = 1.906E+00 * (-0.004, 0.004, 0.009, 0.018, 0.036, 0.072, 0.143, 0.286, 0.572)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50