Center at RA 23 55 09.45817 DEC 49 50 08.3400

CONT: 2352+495 IPOL 8420.302 MHZ 2352+495.ICL001.3

PLot file version 1 created 08-DEC-2002 16:18:57

Cont peak flux = 3.0953E-01 JY/BEAM Levs = 3.095E-01 * (-0.012, 0.012, 0.023, 0.047, 0.094, 0.188, 0.376, 0.752)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50