Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:05:26

1R SC

3.705 3.700 3.695 3.690

2R HN

1.25 1.20 1.15 1.10 1.05

3R NL 0.96 0.94 0.92

4R FD

0.96 0.94 0.92 0.90

5R LA

0.94 0.93 0.92 0.91

6R PT

Gain

0.965 0.960 0.955 0.950 0.945 7R KP

0.94

0.92

0.90

8R OV

0.94 0.92 0.90

9R BR

0.96 0.94 0.92

11R EB

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.03 1.02 1.01 1.00 0.99

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:05:26

12R MC

0.96 0.94 0.92

13R ON 4 3 2 1 14R YB

0.98 0.96 0.94 0.92 0.90 0.88

15R WB

1.02 1.00 0.98 0.96 16R SH

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.30 1.25 1.20 1.15

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 15:05:26

1R SC

3.755 3.750 3.745 3.740

2R HN

1.25 1.20 1.15 1.10 1.05

3R NL

1.07 1.06 1.05 1.04 1.03

4R FD

1.08 1.06 1.04

5R LA

1.04 1.02 1.00

6R PT

Gain

1.00

0.99

0.98

7R KP

1.08 1.06 1.04 1.02

8R OV

1.01 1.00 0.99 0.98 0.97

9R BR

1.03 1.02 1.01 1.00

11R EB

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.00

0.99

0.98

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 15:05:26

12R MC

0.97 0.96 0.95 0.94 13R ON 1.6 1.4 1.2 14R YB

0.92 0.90 0.88 0.86

15R WB

0.99 0.98 0.97

16R SH

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.25 1.20 1.15 1.10

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 15:05:26

1R SC 80 60 40 20 0 2R HN 1.2 1.1 1.0 3R NL

0.98 0.96 0.94

4R FD

1.02 1.01 1.00 0.99

5R LA

0.96 0.95 0.94 0.93

6R PT

Gain

0.98 0.97 0.96 0.95

7R KP

0.925 0.920 0.915 0.910

8R OV

0.98 0.96 0.94

9R BR

0.95 0.94 0.93 0.92

11R EB

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

0.99 0.98 0.97 0.96

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:05:26

12R MC

0.94

0.93

0.92

13R ON 4 3 2 1 14R YB

0.94 0.92 0.90 0.88

15R WB

0.95 0.94 0.93

16R SH

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.35 1.30 1.25

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:05:27

1R SC

4.220 4.215 4.210 4.205

2R HN 1.3 1.2 1.1 3R NL

1.00 0.98 0.96

4R FD

1.08 1.06 1.04

5R LA 1.02 1.00 0.98

6R PT

Gain

1.08 1.06 1.04 1.02

7R KP

0.99 0.98 0.97

8R OV

1.00 0.98 0.96

9R BR

1.04 1.03 1.02

11R EB

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.04 1.03 1.02

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:05:27

12R MC

1.00

0.99

0.98

13R ON 1.3 1.2 1.1 1.0 14R YB

0.92 0.90 0.88 0.86

15R WB

0.995

0.990

0.985

16R SH

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.24 1.22 1.20 1.18 1.16

Gain amp vs UTC time for 0615+820.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:06:34

1R SC 1.1 1.0 0.9 0.8 2R HN 2.0 1.5 1.0 3R NL

0.96 0.94 0.92 0.90

4R FD

0.96 0.94 0.92 0.90 0.88

5R LA

1.05 1.00 0.95 0.90

6R PT

Gain

1.00

0.95

7R KP

0.94 0.92 0.90 0.88

8R OV

0.96 0.94 0.92 0.90

9R BR

0.98 0.96 0.94 0.92 0.90

11R EB

TIME (HOURS)

22 1/00 1/02 1/04 1/06

1.05

1.00

0.95

Gain amp vs UTC time for 0615+820.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:06:34

12R MC

0.96 0.94 0.92 0.90

13R ON 4 3 2 1 14R YB

1.05 1.00 0.95 0.90

15R WB

0.96 0.94 0.92

16R SH 1.4 1.2 1.0 17R UR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06

0.95 0.90 0.85

Gain amp vs UTC time for 0615+820.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 15:06:34

1R SC 1.2 1.1 1.0 0.9 2R HN 2.0 1.5 1.0 3R NL

1.08 1.06 1.04 1.02 1.00

4R FD

1.08 1.06 1.04 1.02 1.00

5R LA 1.2 1.1 1.0 6R PT

Gain

1.04 1.02 1.00 0.98 0.96

7R KP

1.10 1.05 1.00 0.95

8R OV

1.02 1.00 0.98

9R BR

1.05 1.00 0.95

11R EB

TIME (HOURS)

22 1/00 1/02 1/04 1/06

1.05 1.00 0.95

Gain amp vs UTC time for 0615+820.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 15:06:34

12R MC

1.02 1.00 0.98 0.96 0.94 0.92

13R ON 4 3 2 1 14R YB

1.05 1.00 0.95 0.90 0.85

15R WB

0.94 0.92 0.90

16R SH 1.4 1.3 1.2 1.1 17R UR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06

2.6 2.4 2.2

Gain amp vs UTC time for 0615+820.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:06:35

1R SC 1.1 1.0 0.9 2R HN 2.0 1.5 1.0 3R NL

1.00 0.98 0.96 0.94 0.92 4R FD

1.10 1.05 1.00

5R LA

1.15 1.10 1.05 1.00 0.95 6R PT

Gain

1.10 1.05 1.00

7R KP

1.00 0.95 0.90 8R OV

1.02 1.00 0.98 0.96

9R BR

1.05 1.00 0.95 11R EB

TIME (HOURS)

22 1/00 1/02 1/04 1/06

1.08 1.06 1.04 1.02 1.00 0.98

Gain amp vs UTC time for 0615+820.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:06:35

12R MC

1.05

1.00

0.95

13R ON 6 4 2 14R YB

1.05 1.00 0.95 0.90

15R WB

0.96 0.94 0.92 0.90 0.88 16R SH 1.5 1.4 1.3 1.2 1.1 17R UR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06

1.0 0.9 0.8

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:07:58

1R SC

0.94 0.92 0.90 0.88 2R HN 1.5 1.4 1.3 1.2 1.1 3R NL

0.94

0.92

0.90 4R FD

0.94 0.92 0.90

5R LA

0.90 0.85 0.80 0.75 6R PT

Gain

0.96

0.94

0.92 7R KP

0.94 0.92 0.90 0.88 0.86 8R OV

0.930 0.925 0.920

9R BR

0.96 0.94 0.92 0.90

11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.015 1.010 1.005

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:07:58

12R MC

0.94 0.92 0.90

13R ON 2.5 2.0 1.5 1.0 14R YB

0.98 0.96 0.94

15R WB

1.00 0.95 0.90

17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 15:07:58

1R SC 1.04 1.02 1.00

2R HN 1.5 1.4 1.3 1.2 1.1 3R NL

1.05 1.04 1.03 1.02 1.01

4R FD

1.02 1.01 1.00 0.99

5R LA

1.00 0.95 0.90 0.85

6R PT

Gain

1.00

0.98

0.96

7R KP

1.02 1.00 0.98 0.96

8R OV

1.00 0.99 0.98 0.97

9R BR

1.04 1.02 1.00 0.98

11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.000

0.995

0.990

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 15:07:58

12R MC

0.96

0.94

0.92

13R ON 2.5 2.0 1.5 1.0 14R YB

1.01 1.00 0.99 0.98

15R WB

0.94 0.92 0.90 0.88

17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 3.0 2.5

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 15:07:59

1R SC

0.91 0.90 0.89 0.88 0.87

2R HN 1.4 1.2 1.0 3R NL

0.96 0.94 0.92 0.90

4R FD

0.98 0.97 0.96 0.95

5R LA

0.95 0.90 0.85 0.80

6R PT

Gain

0.98 0.96 0.94

7R KP

0.92 0.90 0.88 0.86

8R OV

0.965 0.960 0.955

9R BR

0.93 0.92 0.91

11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

0.975 0.970 0.965

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:07:59

12R MC

0.94 0.92 0.90 0.88

13R ON 2.5 2.0 1.5 1.0 14R YB

1.02 1.01 1.00 0.99

15R WB

0.98 0.96 0.94 0.92 0.90

17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:07:59

1R SC

1.05

1.00

0.95

2R HN 1.6 1.4 1.2 3R NL

0.98 0.96 0.94

4R FD

1.04 1.02 1.00 0.98

5R LA

1.00 0.95 0.90 0.85

6R PT

Gain

1.06 1.04 1.02 1.00 0.98

7R KP

0.98 0.96 0.94 0.92

8R OV

0.99 0.98 0.97

9R BR

1.02 1.01 1.00

11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.03

1.02

1.01

Gain amp vs UTC time for 2002+475.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:07:59

12R MC

1.00 0.98 0.96

13R ON 3 2 1 14R YB

1.04 1.02 1.00

15R WB

0.95 0.90 0.85

17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 0108+388.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:09:51

1R SC 4 3 2 1 2R HN 4 3 2 1 3R NL 0.95 0.90 0.85

4R FD 6 4 2 5R LA 1.2 1.1 1.0 0.9 6R PT

Gain

2.0 1.5 1.0 7R KP

1.05 1.00 0.95 0.90 0.85

8R OV 15 10 5 0 9R BR 2.0 1.5 1.0 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.05 1.00 0.95 0.90

Gain amp vs UTC time for 0108+388.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:09:51

12R MC

1.05 1.00 0.95 0.90 0.85

13R ON 15 10 5 0 14R YB 2.0 1.5 1.0 15R WB 1.1 1.0 0.9 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.15 1.10 1.05

Gain amp vs UTC time for 0108+388.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 15:09:51

1R SC 2.5 2.0 1.5 1.0 2R HN 3 2 1 3R NL

1.10 1.05 1.00 0.95

4R FD 8 6 4 2 5R LA 1.3 1.2 1.1 1.0 0.9 6R PT

Gain

2.0 1.5 1.0 7R KP 1.1 1.0 0.9 8R OV 10 5 0 9R BR 1.8 1.6 1.4 1.2 1.0 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.1 1.0 0.9

Gain amp vs UTC time for 0108+388.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:09:51

12R MC 1.0 0.9 0.8 13R ON 6 4 2 14R YB 2.0 1.5 1.0 15R WB 1.1 1.0 0.9 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.25 1.20 1.15

Gain amp vs UTC time for 0108+388.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:09:52

1R SC 3 2 1 2R HN 3.0 2.5 2.0 1.5 3R NL

1.05 1.00 0.95 0.90 0.85 4R FD 10 8 6 4 2 5R LA 1.3 1.2 1.1 1.0 6R PT

Gain

8 6 4 2 7R KP 1.1 1.0 0.9 8R OV 20 10 0 9R BR 2.0 1.5 1.0 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.10 1.05 1.00 0.95

Gain amp vs UTC time for 0108+388.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:09:52

12R MC 1.1 1.0 0.9 13R ON 6 4 2 14R YB 8 6 4 2 15R WB 1.0 0.9 0.8 16R SH

2.870 2.865 2.860 2.855

17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.24 1.22 1.20 1.18 1.16 1.14

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:13:02

1R SC 3 2 1 2R HN 2.0 1.5 1.0 3R NL

1.00 0.95 0.90

4R FD

1.05 1.00 0.95

5R LA

1.05 1.00 0.95 0.90 6R PT

Gain

1.02 1.00 0.98 0.96 0.94 7R KP

0.98 0.96 0.94 0.92 0.90 0.88 8R OV

1.00 0.95 0.90 9R BR

1.00 0.95 0.90 11R EB

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.04 1.02 1.00 0.98

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:13:02

12R MC

1.05 1.00 0.95 0.90

13R ON 4 3 2 1 14R YB 20 10 0 15R WB

1.15 1.10 1.05 1.00 0.95

16R SH 1.3 1.2 1.1 17R UR

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.1 1.0 0.9 0.8 0.7

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 15:13:02

1R SC 5 4 3 2 1 2R HN 2.0 1.5 1.0 3R NL

1.15 1.10 1.05 1.00

4R FD

1.20 1.15 1.10 1.05

5R LA

1.15 1.10 1.05 1.00

6R PT

Gain

1.06 1.04 1.02 1.00

7R KP

1.10 1.05 1.00

8R OV

1.10 1.05 1.00

9R BR

1.10 1.05 1.00

11R EB

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.04 1.02 1.00 0.98 0.96

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 15:13:02

12R MC

1.05 1.00 0.95 0.90

13R ON 5 4 3 2 1 14R YB 4 3 2 1 15R WB 1.1 1.0 0.9 16R SH

1.25 1.20 1.15 1.10

17R UR

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

2.8 2.6 2.4 2.2 2.0

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 15:13:02

1R SC 1.1 1.0 0.9 0.8 2R HN 1.8 1.6 1.4 1.2 1.0 3R NL

1.00 0.95 0.90

4R FD

1.10 1.05 1.00

5R LA

1.05 1.00 0.95

6R PT

Gain

1.04 1.02 1.00 0.98 0.96

7R KP

0.96 0.94 0.92 0.90 0.88

8R OV

1.05

1.00

0.95

9R BR

1.00 0.95 0.90

11R EB

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.02 1.00 0.98 0.96

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:13:02

12R MC

1.05 1.00 0.95 0.90 0.85

13R ON 5 4 3 2 1 14R YB 5 4 3 2 1 15R WB 1.1 1.0 0.9 16R SH 1.4 1.3 1.2 17R UR

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.0 0.9 0.8 0.7

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:13:02

1R SC 1.1 1.0 0.9 2R HN 2.0 1.5 1.0 3R NL

1.05 1.00 0.95

4R FD

1.15 1.10 1.05

5R LA 1.2 1.1 1.0 6R PT

Gain

1.15 1.10 1.05

7R KP

1.05 1.00 0.95

8R OV

1.10 1.05 1.00

9R BR

1.08 1.06 1.04 1.02 1.00 0.98

11R EB

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.10 1.05 1.00

Gain amp vs UTC time for 0646+600.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:13:02

12R MC 1.1 1.0 0.9 13R ON 8 6 4 2 0 14R YB 5 4 3 2 1 15R WB 1.1 1.0 0.9 16R SH 1.3 1.2 1.1 1.0 17R UR

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04 1/05 1/06 1/07

1.1 1.0 0.9 0.8 0.7

Gain amp vs UTC time for 0710+439.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:17:22

1R SC 1.2 1.1 1.0 0.9 2R HN 1.8 1.6 1.4 1.2 1.0 3R NL 1.2 1.1 1.0 0.9 4R FD

1.05 1.00 0.95 0.90 0.85

5R LA

1.05 1.00 0.95 0.90 0.85

6R PT

Gain

1.2 1.1 1.0 0.9 7R KP

1.00 0.95 0.90 0.85

8R OV 1.4 1.2 1.0 0.8 9R BR 1.1 1.0 0.9 0.8 11R EB

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04

1.1 1.0 0.9 0.8 0.7

Gain amp vs UTC time for 0710+439.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:17:22

12R MC 1.2 1.0 0.8 13R ON 10 5 0 14R YB 2.0 1.5 1.0 15R WB

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04

1.1 1.0 0.9

Gain amp vs UTC time for 0710+439.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 15:17:23

1R SC 1.4 1.2 1.0 2R HN 1.8 1.6 1.4 1.2 1.0 3R NL 1.2 1.0 0.8 4R FD 1.2 1.1 1.0 0.9 5R LA 1.1 1.0 0.9 6R PT

Gain

1.4 1.2 1.0 7R KP

1.00 0.95 0.90 0.85

8R OV 1.6 1.4 1.2 1.0 0.8 9R BR 1.1 1.0 0.9 0.8 11R EB

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04

1.1 1.0 0.9 0.8 0.7

Gain amp vs UTC time for 0710+439.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:17:23

12R MC 1.2 1.0 0.8 13R ON 15 10 5 0 14R YB 30 20 10 0 15R WB

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04

1.1 1.0 0.9 0.8

Gain amp vs UTC time for 0710+439.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:17:23

1R SC 1.2 1.1 1.0 2R HN 2.0 1.5 1.0 3R NL 1.2 1.1 1.0 0.9 4R FD 1.1 1.0 0.9 5R LA

1.10 1.05 1.00 0.95

6R PT

Gain

1.4 1.2 1.0 7R KP

1.05 1.00 0.95 0.90

8R OV 1.6 1.4 1.2 1.0 9R BR 1.2 1.0 0.8 11R EB

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04

1.2 1.0 0.8

Gain amp vs UTC time for 0710+439.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:17:23

12R MC 1.2 1.0 0.8 13R ON 5 4 3 2 1 14R YB 2.0 1.5 1.0 15R WB

Gain

TIME (HOURS)

22 23 1/00 1/01 1/02 1/03 1/04

1.1 1.0 0.9

Gain amp vs UTC time for 1242+410.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:21:01

1R SC 1.2 1.0 0.8 2R HN 1.2 1.0 0.8 3R NL 1.3 1.2 1.1 1.0 0.9 4R FD 1.2 1.0 0.8 5R LA 1.1 1.0 0.9 0.8 0.7 6R PT

Gain

1.2 1.0 0.8 7R KP 1.2 1.0 0.8 8R OV

1.81.6 1.41.2 1.00.8

9R BR 1.2 1.0 0.8 11R EB

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

1.1 1.0 0.9

Gain amp vs UTC time for 1242+410.MULTI.1

SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:21:01

12R MC 1.6 1.4 1.2 1.0 0.8 13R ON 2.0 1.5 1.0 14R YB 1.6 1.4 1.2 1.0 0.8 0.6 15R WB

Gain

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

2.0 1.5 1.0

Gain amp vs UTC time for 1242+410.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 15:21:01

1R SC 1.6 1.4 1.2 1.0 0.8 2R HN 1.4 1.2 1.0 3R NL 1.6 1.4 1.2 1.0 4R FD 1.4 1.2 1.0 5R LA 1.3 1.2 1.1 1.0 0.9 6R PT

Gain

1.2 1.0 0.8 7R KP 1.6 1.4 1.2 1.0 0.8 8R OV 2.0 1.5 1.0 9R BR 2.0 1.5 1.0 11R EB

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 1242+410.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 15:21:01

12R MC 1.6 1.4 1.2 1.0 0.8 13R ON

1.61.4 1.21.0 0.80.6

14R YB 1.0 0.9 0.8 0.7 15R WB

Gain

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

1.5 1.0

Gain amp vs UTC time for 1242+410.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 15:21:02

1R SC 1.4 1.2 1.0 0.8 2R HN 1.2 1.0 0.8 3R NL 1.1 1.0 0.9 0.8 4R FD 1.2 1.0 0.8 5R LA 1.2 1.0 0.8 6R PT

Gain

1.2 1.0 0.8 7R KP 1.2 1.0 0.8 8R OV 2.0 1.5 1.0 9R BR 1.2 1.0 0.8 11R EB

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

1.1 1.0 0.9

Gain amp vs UTC time for 1242+410.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:21:02

12R MC 1.4 1.2 1.0 0.8 13R ON 2.0 1.5 1.0 0.5 14R YB 1.2 1.0 0.8 15R WB

Gain

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

1.5 1.0

Gain amp vs UTC time for 1242+410.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:21:02

1R SC 1.6 1.4 1.2 1.0 0.8 2R HN 1.3 1.2 1.1 1.0 0.9 3R NL 1.2 1.1 1.0 0.9 4R FD 1.4 1.2 1.0 5R LA 1.2 1.0 0.8 6R PT

Gain

1.6 1.4 1.2 1.0 0.8 7R KP 1.2 1.0 0.8 8R OV 1.4 1.2 1.0 0.8 9R BR 1.3 1.2 1.1 1.0 0.9 11R EB

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 1242+410.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:21:02

12R MC 1.6 1.4 1.2 1.0 0.8 13R ON 2.5 2.0 1.5 1.0 0.5 14R YB 1.4 1.2 1.0 0.8 15R WB

Gain

TIME (HOURS)

1/03 1/04 1/05 1/06 1/07 1/08 1/09 1/10

2.5 2.0 1.5 1.0

Gain amp vs UTC time for 1245+676.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:23:30

1R SC 1.2 1.0 0.8 0.6 0.4 2R HN 1.4 1.2 1.0 3R NL

0.95 0.90 0.85 0.80

4R FD

2.145 2.140 2.135 2.130

5R LA 0.8 0.7 0.6 6R PT

Gain

1.2 1.0 0.8 7R KP 0.9 0.8 0.7 0.6 8R OV

0.810 0.805 0.800 0.795

11R EB 1.2 1.0 0.8 12R MC

TIME (HOURS)

1/04 1/05 1/06 1/07 1/08

1.8 1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for 1245+676.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 15:23:31

13R ON 1.4 1.3 1.2 15R WB 2.0 1.5 1.0 16R SH

Gain

TIME (HOURS)

1/04 1/05 1/06 1/07 1/08

0.240 0.235 0.230 0.225

Gain amp vs UTC time for 1245+676.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 15:23:31

1R SC

1.195 1.190 1.185 1.180

2R HN 1.1 1.0 0.9 0.8 0.7 3R NL

1.05 1.00 0.95 0.90 0.85

5R LA

0.745 0.740 0.735 0.730

6R PT 1.2 1.0 0.8 0.6 0.4 7R KP

Gain

1.6 1.4 1.2 1.0 0.8 8R OV 2.0 1.5 1.0 11R EB 1.2 1.0 0.8 12R MC

1.81.6 1.41.2 1.00.8

13R ON

TIME (HOURS)

1/04 1/05 1/06 1/07 1/08

1.5 1.0 0.5

Gain amp vs UTC time for 1245+676.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:23:31

15R WB

Gain

TIME (HOURS)

1/04 1/05 1/06 1/07 1/08

2.0 1.5 1.0 0.5

Gain amp vs UTC time for 1245+676.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:23:31

2R HN 1.3 1.2 1.1 1.0 3R NL 1.8 1.6 1.4 1.2 1.0 0.8 4R FD

0.945 0.940 0.935 0.930

5R LA 0.8 0.7 0.6 6R PT 1.4 1.2 1.0 0.8 7R KP

Gain

1.1 1.0 0.9 0.8 8R OV 1.4 1.2 1.0 0.8 11R EB 1.2 1.0 0.8 12R MC 2.0 1.5 1.0 13R ON

TIME (HOURS)

1/04 1/05 1/06 1/07 1/08

2.5 2.0 1.5 1.0

Gain amp vs UTC time for 1245+676.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:23:31

15R WB

Gain

TIME (HOURS)

1/04 1/05 1/06 1/07 1/08

2.5 2.0 1.5 1.0

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 15:24:57

1R SC 4 3 2 1 2R HN

1.15 1.10 1.05 1.00 0.95

3R NL

1.00 0.95 0.90 0.85

4R FD 5 4 3 2 1 5R LA

1.00 0.95 0.90 0.85

6R PT

Gain

1.00 0.95 0.90 0.85

7R KP 1.2 1.0 0.8 8R OV 0.94 0.92 0.90

9R BR

0.98 0.96 0.94 0.92 0.90

11R EB

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

1.05

1.00

0.95

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 15:24:57

12R MC

1.00 0.95 0.90 0.85

13R ON 2.5 2.0 1.5 1.0 14R YB 1.2 1.1 1.0 0.9 15R WB

1.00 0.95 0.90 0.85

17R UR

Gain

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

1.1 1.0 0.9 0.8 0.7

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 15:24:58

1R SC 8 6 4 2 2R HN 1.2 1.1 1.0 3R NL 1.1 1.0 0.9 4R FD

1.15 1.10 1.05 1.00 0.95

5R LA 6 4 2 6R PT

Gain

1.05 1.00 0.95 0.90

7R KP 5 4 3 2 1 8R OV

1.02 1.00 0.98 0.96 0.94

9R BR

1.10 1.05 1.00

11R EB

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

1.04 1.02 1.00 0.98 0.96 0.94

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 15:24:58

12R MC

1.05 1.00 0.95 0.90 0.85

13R ON 2.0 1.5 1.0 14R YB 1.1 1.0 0.9 15R WB 1.0 0.9 0.8 17R UR

Gain

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

2.8 2.6 2.4 2.2 2.0

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 15:24:58

1R SC 1.0 0.9 0.8 0.7 2R HN

1.05 1.00 0.95 0.90

3R NL

1.05 1.00 0.95 0.90 0.85

4R FD 1.1 1.0 0.9 5R LA 4 3 2 1 6R PT

Gain

1.00 0.95 0.90

7R KP 1.0 0.9 0.8 8R OV 1.1 1.0 0.9 9R BR 1.1 1.0 0.9 0.8 11R EB

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

1.02 1.00 0.98 0.96 0.94 0.92

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 15:24:58

12R MC

1.00 0.95 0.90 0.85

13R ON

1.81.6 1.41.2 1.00.8

14R YB 1.0 0.9 0.8 15R WB 1.0 0.9 0.8 17R UR

Gain

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

0.90 0.85 0.80 0.75

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 15:24:58

1R SC 1.2 1.0 0.8 2R HN 1.2 1.1 1.0 3R NL

1.00 0.95 0.90

4R FD 6 4 2 5R LA 1.3 1.2 1.1 1.0 6R PT

Gain

1.05 1.00 0.95 0.90

7R KP 1.0 0.9 0.8 8R OV 1.1 1.0 0.9 9R BR

1.10 1.05 1.00

11R EB

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

1.10 1.05 1.00

Gain amp vs UTC time for 1843+356.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 15:24:58

12R MC

1.05 1.00 0.95 0.90

13R ON 1.4 1.2 1.0 0.8 14R YB 1.1 1.0 0.9 0.8 15R WB

0.95 0.90 0.85 0.80 0.75

17R UR

Gain

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13

1.0 0.9 0.8 0.7

Gain amp vs UTC time for 1943+546.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 16:12:34

1R SC 1.2 1.1 1.0 0.9 2R HN 1.8 1.6 1.4 1.2 1.0 3R NL

1.10 1.05 1.00 0.95 4R FD

1.15 1.10 1.05 1.00 0.95

5R LA 6 4 2 6R PT

Gain

1.05 1.00 0.95

7R KP 1.2 1.1 1.0 0.9 8R OV

1.15 1.10 1.05 1.00 0.95 9R BR 1.2 1.1 1.0 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.02 1.00 0.98 0.96 0.94

Gain amp vs UTC time for 1943+546.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 16:12:34

12R MC 1.0 0.9 0.8 13R ON 3 2 1 14R YB 1.2 1.0 0.8 15R WB 1.0 0.9 0.8 0.7 16R SH 1.2 1.1 1.0 0.9 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

3.5 3.0 2.5 2.0

Gain amp vs UTC time for 1943+546.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 16:12:35

1R SC 1.0 0.9 0.8 2R HN 1.8 1.6 1.4 1.2 1.0 3R NL

1.00 0.95 0.90

4R FD

1.05 1.00 0.95 0.90 5R LA

1.05 1.00 0.95 0.90 0.85 6R PT

Gain

1.05 1.00 0.95 0.90

7R KP 4 3 2 1 8R OV

1.05 1.00 0.95 0.90 9R BR 1.2 1.1 1.0 0.9 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.05 1.00 0.95

Gain amp vs UTC time for 1943+546.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 16:12:35

12R MC 1.0 0.9 0.8 0.7 13R ON 4 3 2 1 14R YB 2.0 1.5 1.0 15R WB 1.0 0.9 0.8 16R SH 1.3 1.2 1.1 1.0 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.2 1.0 0.8

Gain amp vs UTC time for 1943+546.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 16:12:35

1R SC 1.2 1.0 0.8 2R HN 2.0 1.5 1.0 3R NL

1.05 1.00 0.95 0.90

4R FD

1.15 1.10 1.05 1.00 0.95

5R LA

1.15 1.10 1.05 1.00 0.95

6R PT

Gain

1.05 1.00 0.95

7R KP

1.05 1.00 0.95 0.90

8R OV

1.05 1.00 0.95 9R BR

1.15 1.10 1.05 1.00

11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.10

1.05

1.00

Gain amp vs UTC time for 1943+546.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 16:12:35

12R MC 1.1 1.0 0.9 0.8 13R ON 2.0 1.5 1.0 14R YB 1.2 1.0 0.8 15R WB 1.0 0.9 0.8 0.7 16R SH 1.2 1.1 1.0 0.9 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.2 1.0 0.8

Gain amp vs UTC time for 2021+614.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 08-DEC-2002 16:15:23

1R SC 1.1 1.0 0.9 2R HN 3 2 1 3R NL 1.2 1.1 1.0 0.9 4R FD

1.00 0.95 0.90

5R LA

1.02 1.00 0.98 0.96 0.94 0.92

6R PT

Gain

1.05 1.00 0.95

7R KP

1.00 0.95 0.90

8R OV

1.00 0.98 0.96 0.94 0.92

9R BR 1.2 1.1 1.0 0.9 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.06 1.04 1.02 1.00 0.98 0.96

Gain amp vs UTC time for 2021+614.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 16:15:23

12R MC

1.00 0.95 0.90

13R ON 5 4 3 2 1 14R YB 1.3 1.2 1.1 1.0 0.9 15R WB 1.1 1.0 0.9 16R SH 3 2 1 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.0 0.9 0.8

Gain amp vs UTC time for 2021+614.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 16:15:23

1R SC 1.2 1.1 1.0 2R HN 4 3 2 1 3R NL 1.4 1.2 1.0 4R FD 1.2 1.1 1.0 5R LA

1.06 1.04 1.02 1.00

6R PT

Gain

1.10 1.05 1.00

7R KP

1.10 1.05 1.00

8R OV 1.05 1.00

9R BR 1.2 1.1 1.0 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.05 1.00 0.95

Gain amp vs UTC time for 2021+614.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 16:15:23

12R MC

1.00 0.95 0.90

13R ON 5 4 3 2 1 14R YB 1.2 1.1 1.0 0.9 15R WB 1.0 0.9 0.8 16R SH 2.5 2.0 1.5 1.0 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

2.8 2.6 2.4 2.2

Gain amp vs UTC time for 2021+614.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 16:15:23

1R SC 1.0 0.9 0.8 2R HN 2.5 2.0 1.5 1.0 3R NL 1.2 1.1 1.0 0.9 4R FD

1.10 1.05 1.00 0.95

5R LA

1.00 0.98 0.96 0.94

6R PT

Gain

1.05 1.00

7R KP

1.00 0.95 0.90

8R OV

1.10 1.05 1.00 0.95

9R BR 1.2 1.1 1.0 0.9 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.02 1.00 0.98 0.96 0.94

Gain amp vs UTC time for 2021+614.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 16:15:23

12R MC

1.00 0.95 0.90

13R ON 5 4 3 2 1 14R YB 1.3 1.2 1.1 1.0 15R WB 1.2 1.1 1.0 0.9 16R SH 2.5 2.0 1.5 1.0 17R UR

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.0 0.9 0.8

Gain amp vs UTC time for 2021+614.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 16:15:23

1R SC 1.2 1.1 1.0 2R HN 3 2 1 3R NL 1.3 1.2 1.1 1.0 0.9 4R FD

1.15 1.10 1.05 1.00

5R LA

1.08 1.06 1.04 1.02 1.00

6R PT

Gain

1.10

1.05

1.00

7R KP

1.10 1.05 1.00 0.95

8R OV

1.08 1.06 1.04 1.02 1.00 0.98

9R BR 1.3 1.2 1.1 1.0 11R EB

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.10

1.05

1.00

Gain amp vs UTC time for 2352+495.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 08-DEC-2002 16:18:29

12R MC 1.1 1.0 0.9 0.8 0.7 13R ON 10 5 0 14R YB 2.5 2.0 1.5 1.0 0.5 15R WB

Gain

TIME (HOURS)

20 1/00 1/04 1/08 1/12

1.2 1.0 0.8

Gain amp vs UTC time for 2352+495.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 08-DEC-2002 16:18:29

1R SC 1.2 1.1 1.0 0.9 2R HN 2.5 2.0 1.5 1.0 3R NL 4 3 2 1 4R FD 1.4 1.2 1.0 5R LA

1.05 1.00 0.95 0.90 0.85 6R PT

Gain

1.05 1.00 0.95 0.90 0.85 7R KP 4 3 2 1 8R OV

1.10 1.05 1.00 0.95

9R BR 2.5 2.0 1.5 1.0 11R EB

TIME (HOURS)

20 1/00 1/04 1/08 1/12

1.1 1.0 0.9 0.8

Gain amp vs UTC time for 2352+495.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 08-DEC-2002 16:18:29

12R MC 3 2 1 13R ON 3 2 1 14R YB 10 5 0 15R WB 1.2 1.0 0.8 17R UR

Gain

TIME (HOURS)

20 1/00 1/04 1/08 1/12

1.350 1.345 1.340 1.335

Gain amp vs UTC time for 2352+495.MULTI.1 SN 2 Rpol IF 3

Plot file version 5 created 08-DEC-2002 16:18:29

1R SC 1.0 0.9 0.8 0.7 2R HN 2.0 1.5 1.0 3R NL 3 2 1 4R FD 1.2 1.1 1.0 5R LA 1.0 0.9 0.8 6R PT

Gain

1.05 1.00 0.95 0.90

7R KP 4 3 2 1 8R OV

1.05 1.00 0.95 0.90 9R BR 1.2 1.0 0.8 11R EB

TIME (HOURS)

20 1/00 1/04 1/08 1/12

1.0 0.9 0.8

Gain amp vs UTC time for 2352+495.MULTI.1 SN 2 Rpol IF 3

Plot file version 6 created 08-DEC-2002 16:18:29

12R MC 1.1 1.0 0.9 0.8 0.7 13R ON 8 6 4 2 0 14R YB 3 2 1 15R WB

Gain

TIME (HOURS)

20 1/00 1/04 1/08 1/12

1.3 1.2 1.1 1.0 0.9

Gain amp vs UTC time for 2352+495.MULTI.1 SN 2 Rpol IF 4

Plot file version 7 created 08-DEC-2002 16:18:29

1R SC 1.1 1.0 0.9 0.8 2R HN 2.5 2.0 1.5 1.0 3R NL 3 2 1 4R FD 1.3 1.2 1.1 1.0 5R LA

1.05 1.00 0.95 0.90

6R PT

Gain

1.15 1.10 1.05 1.00 0.95

7R KP 6 4 2 8R OV

1.05 1.00 0.95

9R BR 2.0 1.5 1.0 11R EB

TIME (HOURS)

20 1/00 1/04 1/08 1/12

1.2 1.0 0.8

Gain amp vs UTC time for 2352+495.MULTI.1 SN 2 Rpol IF 4

Plot file version 8 created 08-DEC-2002 16:18:29

12R MC 1.2 1.0 0.8 13R ON 5 4 3 2 1 14R YB 2.5 2.0 1.5 1.0 15R WB

Gain

TIME (HOURS)

20 1/00 1/04 1/08 1/12

1.2 1.0 0.8