Center at RA 18 32 43.47112 DEC 13 57 44.4003

CONT: J1832+13 IPOL 1637.365 MHZ J1832+1357.ICL001.5

PLot file version 1 created 31-AUG-2004 19:02:37

Cont peak flux = 4.2018E-01 JY/BEAM Levs = 4.202E-01 * (-0.020, 0.020, 0.040, 0.080, 0.160, 0.320, 0.639)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250