Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 31-AUG-2004 18:54:20

1 EB IF 1R 1.0 0.9 0.8 0.7 1 EB IF 1L 1.0 0.9 0.8 0.7 1 EB IF 2R 1.0 0.9 0.8 1 EB IF 2L 1.1 1.0 0.9 0.8 2 MC IF 1R 1.0 0.9 0.8 0.7 2 MC IF 1L

Gain

0.9 0.8 0.7 2 MC IF 2R 1.0 0.8 0.6 2 MC IF 2L 1.0 0.9 0.8 0.7 3 WB IF 1R

1.00 0.95 0.90

3 WB IF 1L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.00 0.95 0.90

Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 31-AUG-2004 18:54:20

3 WB IF 2R

0.98 0.96 0.94 0.92 0.90 3 WB IF 2L

1.35

1.30

1.25 4 ON IF 1R 1.6 1.4 1.2 1.0 0.8 4 ON IF 1L 1.8 1.6 1.4 1.2 1.0 0.8 4 ON IF 2R 1.4 1.2 1.0 0.8 4 ON IF 2L

Gain

2.0 1.5 1.0 5 TR IF 1R 1.0 0.8 0.6 5 TR IF 1L 1.2 1.0 0.8 0.6 5 TR IF 2R 1.0 0.9 0.8 0.7 5 TR IF 2L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.0 0.8 0.6

Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 31-AUG-2004 18:54:20

6 NT IF 1R 1.4 1.2 1.0 0.8 0.6 6 NT IF 1L 1.2 1.0 0.8 6 NT IF 2R 1.4 1.2 1.0 0.8 6 NT IF 2L

0.68 0.66 0.64 0.62 0.60

7 HH IF 1R 1.0 0.9 0.8 7 HH IF 1L

Gain

1.1 1.0 0.9 7 HH IF 2R 1.0 0.9 0.8 0.7 7 HH IF 2L 1.0 0.9 0.8 0.7 9 CM IF 2R

0.88

0.87

0.86

9 CM IF 2L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

0.855 0.850 0.845 0.840 0.835

Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 31-AUG-2004 18:54:20

10 SC IF 1R 1.1 1.0 0.9 0.8 0.7 10 SC IF 1L 1.1 1.0 0.9 0.8 0.7 10 SC IF 2R 1.0 0.9 0.8 0.7 10 SC IF 2L 1.0 0.9 0.8 11 GB IF 1R 1.8 1.6 1.4 1.2 1.0 0.8 11 GB IF 1L

Gain

2.0 1.5 1.0 11 GB IF 2R 2.0 1.5 1.0 0.5 11 GB IF 2L 2.0 1.5 1.0 12 HN IF 1R 1.2 1.0 0.8 0.6 12 HN IF 1L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.2 1.0 0.8

Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 5 created 31-AUG-2004 18:54:20

12 HN IF 2R 1.2 1.0 0.8 0.6 12 HN IF 2L 1.5 1.0 0.5 13 NL IF 1R 1.1 1.0 0.9 0.8 0.7 13 NL IF 1L 1.1 1.0 0.9 0.8 0.7 13 NL IF 2R 1.0 0.9 0.8 0.7 13 NL IF 2L

Gain

1.0 0.9 0.8 0.7 14 FD IF 1R 1.0 0.9 0.8 0.7 14 FD IF 1L 1.0 0.9 0.8 0.7 14 FD IF 2R 1.0 0.9 0.8 14 FD IF 2L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

0.9 0.8 0.7

Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 6 created 31-AUG-2004 18:54:20

15 LA IF 1R 1.1 1.0 0.9 0.8 0.7 15 LA IF 1L 1.2 1.0 0.8 15 LA IF 2R 1.0 0.9 0.8 15 LA IF 2L 1.0 0.9 0.8 0.7 16 PT IF 1R 1.0 0.9 0.8 0.7 16 PT IF 1L

Gain

1.2 1.0 0.8 16 PT IF 2R 1.0 0.9 0.8 0.7 16 PT IF 2L 1.0 0.9 0.8 0.7 17 YY IF 1R 1.0 0.8 0.6 17 YY IF 1L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.0 0.8 0.6

Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 7 created 31-AUG-2004 18:54:20

17 YY IF 2R 1.0 0.8 0.6 17 YY IF 2L 1.0 0.8 0.6 18 KP IF 1R 1.0 0.9 0.8 18 KP IF 1L 1.1 1.0 0.9 0.8 18 KP IF 2R 1.0 0.9 0.8 0.7 18 KP IF 2L

Gain

1.1 1.0 0.9 0.8 19 OV IF 1R 1.0 0.9 0.8 0.7 19 OV IF 1L 1.2 1.0 0.8 19 OV IF 2R 1.0 0.9 0.8 19 OV IF 2L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.0 0.9 0.8

Gain amp vs UTC time for NRAO512.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 8 created 31-AUG-2004 18:54:20

20 BR IF 1R 1.2 1.0 0.8 20 BR IF 1L 1.2 1.0 0.8 20 BR IF 2R 1.0 0.8 0.6 20 BR IF 2L 1.2 1.0 0.8 21 MK IF 1R 1.2 1.0 0.8 21 MK IF 1L

Gain

1.4 1.2 1.0 0.8 21 MK IF 2R 1.1 1.0 0.9 0.8 0.7 21 MK IF 2L

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

1.2 1.0 0.8