Center at RA 19 11 49.55500 DEC 04 58 56.9490

CONT: SS433 IPOL 1637.365 MHZ SS433.IIM001.2

PLot file version 1 created 31-AUG-2004 18:50:55

Cont peak flux = 4.4575E-02 JY/BEAM Levs = 4.457E-02 * (-0.081, 0.081, 0.163, 0.325, 0.651)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250