Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 07-NOV-2005 11:44:20

1 JB IF 1R 970 960 950 940 1 JB IF 1L 990 980 970 960 1 JB IF 2R 850 840 830 820 810 1 JB IF 2L

1250

1200

1150

2 EF IF 1R

1025 1020 1015 1010 1005

2 EF IF 1L

MilliGain

1020

1010

1000 2 EF IF 2R

1015 1010 1005 1000 995 2 EF IF 2L

1010

1000 990 4 NT IF 1R 980 970 960 4 NT IF 1L

TIME (HOURS)

21 23 30 24 00 30 25 00 30 26 00 30 27 00 30

1140

1130

1120

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 07-NOV-2005 11:44:20

4 NT IF 2R 955 950 945 940 935 5 CM IF 1R 980 970 960 5 CM IF 1L

1025 1020 1015 1010 1005 5 CM IF 2R

1070

1060

1050

5 CM IF 2L 975 970 965 960 955 6 WB IF 1R

MilliGain

920 910 900 6 WB IF 1L

1015 1010 1005 1000 995 6 WB IF 2R

1065

1060

6 WB IF 2L

1050

1040

1030

7 HN IF 1R

TIME (HOURS)

21 23 30 24 00 30 25 00 30 26 00 30 27 00 30

1080

1060

1040

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 07-NOV-2005 11:44:20

7 HN IF 1L

1120

1100

1080

7 HN IF 2R

1100 1080 1060 1040

7 HN IF 2L

1100 1080 1060 1040 8 FD IF 1R

1005 1000 995 990 985 8 FD IF 1L

1010 1005 1000 995 8 FD IF 2R

MilliGain

1120 1100 1080 1060

8 FD IF 2L

1070

1060

1050 9 NL IF 1R 960 940 920 9 NL IF 1L 960 940 920 9 NL IF 2R

TIME (HOURS)

21 23 30 24 00 30 25 00 30 26 00 30 27 00 30

955 950 945 940

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 07-NOV-2005 11:44:20

9 NL IF 2L 970 965 960 10 LA IF 1R 950 940 930 10 LA IF 1L 950 940 930 10 LA IF 2R 970 965 960 955 10 LA IF 2L 965 960 955 950 945 11 PT IF 1R

MilliGain

960 950 940 11 PT IF 1L 930 920 910 11 PT IF 2R 970 965 960 11 PT IF 2L

1005 1000 995 990 12 KP IF 1R

TIME (HOURS)

21 23 30 24 00 30 25 00 30 26 00 30 27 00 30

946 944 942 940 938

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 5 created 07-NOV-2005 11:44:20

12 KP IF 1L

1000 990 980 12 KP IF 2R 935 930 925 12 KP IF 2L 960 955 950 13 BR IF 1R

1140 1120 1100 1080 1060

13 BR IF 1L 980 960 940 920 13 BR IF 2R

MilliGain

1080 1060 1040 1020

13 BR IF 2L

1020 1000 980 14 OV IF 1R

1000 990 980 970 14 OV IF 1L 980 970 960 14 OV IF 2R

TIME (HOURS)

21 23 30 24 00 30 25 00 30 26 00 30 27 00 30

1070 1060 1050 1040 1030

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 6 created 07-NOV-2005 11:44:20

14 OV IF 2L

1010 1000 990 980 15 MK IF 1R

1040 1030 1020 1010

15 MK IF 1L

1060 1050 1040 1030

15 MK IF 2R

1000 980 960 15 MK IF 2L

1050 1040 1030 1020 1010

17 SC IF 1R

MilliGain

1250 1200 1150

17 SC IF 1L

1250 1200 1150

17 SC IF 2R

1300

1250

1200

17 SC IF 2L

TIME (HOURS)

21 23 30 24 00 30 25 00 30 26 00 30 27 00 30

1250 1200 1150