Center at RA 09 58 47.24510 DEC 65 33 54.8181

CONT: J0958+65 IPOL 1665.459 MHZ J0958+65.IIM001.1

PLot file version 1 created 07-NOV-2005 11:08:41

Cont peak flux = 4.5074E-01 JY/BEAM Levs = 4.507E-01 * (-0.062, 0.062, 0.123, 0.247, 0.493, 0.987)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250