Center at RA 09 55 50.69400 DEC 69 40 43.6900

CONT: M82 IPOL 1665.459 MHZ M82.IIM001.2

PLot file version 1 created 07-NOV-2005 11:23:21

Cont peak flux = 1.1738E-03 JY/BEAM Levs = 1.174E-03 * (-0.124, 0.124, 0.248, 0.495, 0.990)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250