Gain amp vs UTC time for J1317+4115.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 06-OCT-2004 10:02:51

1 EF IF 1R

1.04 1.02 1.00 0.98 0.96

1 EF IF 1L

1.00 0.98 0.96 0.94

1 EF IF 2R

1.05

1.00

0.95

1 EF IF 2L

1.00 0.98 0.96 0.94

2 JB IF 1R

1.00 0.95 0.90

2 JB IF 1L

Gain

1.02 1.00 0.98 0.96 0.94 0.92

2 JB IF 2R

1.00

0.95

0.90

2 JB IF 2L

1.35 1.30 1.25

3 MC IF 1R

1.05 1.00 0.95 0.90

3 MC IF 1L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

1.10 1.05 1.00 0.95

Gain amp vs UTC time for J1317+4115.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 06-OCT-2004 10:02:51

3 MC IF 2R

1.05 1.00 0.95 0.90

3 MC IF 2L

1.10 1.05 1.00 0.95

4 NT IF 1R 1.3 1.2 1.1 4 NT IF 1L

1.05 1.00 0.95 0.90

4 NT IF 2R

1.05 1.00 0.95 0.90

4 NT IF 2L

Gain

1.10 1.05 1.00 0.95

5 TR IF 1R

0.52 0.50 0.48 0.46 0.44

5 TR IF 1L 1.4 1.3 1.2 5 TR IF 2R

0.60

0.55

0.50

5 TR IF 2L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

1.4 1.3 1.2

Gain amp vs UTC time for J1317+4115.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 06-OCT-2004 10:02:51

6 WB IF 1R

1.08 1.06 1.04 1.02 1.00 0.98

6 WB IF 1L

1.10

1.05

1.00

6 WB IF 2R

1.05

1.00

0.95

6 WB IF 2L

1.06 1.04 1.02 1.00 0.98

7 ON IF 1R 1.5 1.4 1.3 1.2 1.1 7 ON IF 1L

Gain

1.5 1.4 1.3 1.2 1.1 7 ON IF 2R 1.5 1.4 1.3 1.2 1.1 7 ON IF 2L 1.6 1.4 1.2 8 SC IF 1L

1.865 1.860 1.855 1.850

8 SC IF 2R

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

3.055 3.050 3.045 3.040

Gain amp vs UTC time for J1317+4115.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 06-OCT-2004 10:02:51

10 NL IF 2R

0.995 0.990 0.985 0.980

10 NL IF 2L

1.465 1.460 1.455 1.450

12 LA IF 2R

1.065 1.060 1.055 1.050

13 PT IF 1L

1.165 1.160 1.155 1.150

13 PT IF 2R

1.110 1.105 1.100 1.095

13 PT IF 2L

Gain

1.150 1.145 1.140 1.135

15 OV IF 1R

0.915 0.910 0.905 0.900

15 OV IF 2R

1.130 1.125 1.120 1.115

16 BR IF 2L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

1.690 1.685 1.680 1.675