Gain phs vs UTC time for J1317+4115.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 06-OCT-2004 10:02:41

1 EF IF 1R

0.010 0.005 0.000 -0.005

1 EF IF 1L

0.010 0.005 0.000 -0.005

1 EF IF 2R

0.010 0.005 0.000 -0.005

1 EF IF 2L

0.010 0.005 0.000 -0.005

2 JB IF 1R 3 2 1 0 -1 2 JB IF 1L

Degrees

1 0 -1 -2 2 JB IF 2R 1 0 -1 -2 -3 2 JB IF 2L 4 2 0 3 MC IF 1R 1 0 -1 3 MC IF 1L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

2 1 0 -1

Gain phs vs UTC time for J1317+4115.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 06-OCT-2004 10:02:41

3 MC IF 2R 2 1 0 -1 3 MC IF 2L 2 0 -2 4 NT IF 1R 2 0 -2 4 NT IF 1L 2 0 -2 -4 -6 4 NT IF 2R 1 0 -1 -2 -3 4 NT IF 2L

Degrees

6 4 2 0 -2 5 TR IF 1R 4 2 0 -2 5 TR IF 1L 0 -2 -4 5 TR IF 2R 2 0 -2 5 TR IF 2L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

4 2 0 -2

Gain phs vs UTC time for J1317+4115.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 3 created 06-OCT-2004 10:02:41

6 WB IF 1R 4 2 0 -2 6 WB IF 1L 2 0 -2 6 WB IF 2R 1 0 -1 -2 -3 6 WB IF 2L 4 2 0 7 ON IF 1R 4 2 0 -2 7 ON IF 1L

Degrees

0 -2 -4 7 ON IF 2R 4 2 0 -2 -4 7 ON IF 2L 5 0 -5 -10 8 SC IF 1R 300 250 200 150 8 SC IF 1L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

-120

-125

-130

Gain phs vs UTC time for J1317+4115.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 4 created 06-OCT-2004 10:02:41

8 SC IF 2R 320 300 280 260 240 220 8 SC IF 2L

-142.685 -142.690 -142.695 -142.700

9 HN IF 1R

103.360 103.355 103.350 103.345

9 HN IF 2R

114.210 114.205 114.200 114.195

10 NL IF 1R -60 -80 -100

10 NL IF 1L

Degrees

120 100 80 60 40 10 NL IF 2R 120 100 80 60 10 NL IF 2L 80 60 40 20 0 -20 11 FD IF 1R

-15.335 -15.340 -15.345 -15.350

11 FD IF 1L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

0 -50 -100 -150

Gain phs vs UTC time for J1317+4115.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 5 created 06-OCT-2004 10:02:41

11 FD IF 2R

-33.490 -33.495 -33.500 -33.505

11 FD IF 2L

35.905 35.900 35.895 35.890

12 LA IF 1R

-15.730 -15.735 -15.740 -15.745

12 LA IF 1L 50 0 -50 -100

12 LA IF 2R

-117.235 -117.240 -117.245 -117.250

12 LA IF 2L

Degrees

60 50 40 13 PT IF 1R 40 20 0 -20 13 PT IF 1L 38 36 34 32 13 PT IF 2R 100 50 0 13 PT IF 2L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

-20 -40 -60 -80 -100 -120

Gain phs vs UTC time for J1317+4115.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 6 created 06-OCT-2004 10:02:41

14 KP IF 1R

-173.040 -173.045 -173.050 -173.055 14 KP IF 1L

-165.400 -165.405 -165.410 -165.415 14 KP IF 2R

-83.995 -84.000 -84.005 -84.010

14 KP IF 2L

155.065 155.060 155.055 155.050

15 OV IF 1R

103.190 103.185 103.180 103.175

15 OV IF 1L

Degrees

-92.675 -92.680 -92.685 -92.690

15 OV IF 2R

-161.095 -161.100 -161.105 -161.110

15 OV IF 2L

33.685 33.680 33.675 33.670

16 BR IF 1R 300 295 290 16 BR IF 1L

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

50 0 -50

Gain phs vs UTC time for J1317+4115.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 7 created 06-OCT-2004 10:02:41

16 BR IF 2R

-60.920 -60.925 -60.930 -60.935

16 BR IF 2L

Degrees

TIME (HOURS)

22 00 30 23 00 30 1/00 00 30 1/01 00

300 200 100