Center at RA 13 17 39.19500 DEC 41 15 45.6200

CONT: J1317+41 IPOL 4993.365 MHZ J1317+4115.IIM001.2

PLot file version 1 created 06-OCT-2004 10:01:58

Cont peak flux = 2.6907E-01 JY/BEAM Levs = 2.691E-01 * (-0.285, 0.285, 0.570)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100