Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 05-OCT-2004 17:51:33

1 EF IF 1R

1.020 1.015 1.010 1.005

1 EF IF 1L

1.005 1.000 0.995 0.990 0.985 1 EF IF 2R

1.020 1.015 1.010 1.005

1 EF IF 2L

0.995 0.990 0.985

2 JB IF 1R

1.030

1.025

1.020

2 JB IF 1L

Gain

0.955

0.950

0.945

2 JB IF 2R

0.84 0.83 0.82

2 JB IF 2L

1.20

1.19

1.18

3 MC IF 1R

1.045 1.040 1.035 1.030

3 MC IF 1L

TIME (HOURS)

19 52 53 54 55 56 57 58 59 20 00 01

1.025 1.020 1.015 1.010 1.005

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 05-OCT-2004 17:51:33

3 MC IF 2R

1.045 1.040 1.035

3 MC IF 2L

1.020 1.015 1.010 1.005

4 NT IF 1R

1.235 1.230 1.225 1.220

4 NT IF 1L

0.970

0.965

0.960

4 NT IF 2R

1.02 1.01 1.00 0.99

4 NT IF 2L

Gain

1.045 1.040 1.035 1.030 1.025 5 TR IF 1R

0.460 0.455 0.450 0.445

5 TR IF 1L

0.415 0.410 0.405

5 TR IF 2R

0.442 0.440 0.438 0.436 0.434 0.432 5 TR IF 2L

TIME (HOURS)

19 52 53 54 55 56 57 58 59 20 00 01

0.41

0.40

0.39

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 05-OCT-2004 17:51:33

6 WB IF 1R

1.01

1.00

0.99

6 WB IF 1L

1.010 1.008 1.006 1.004 1.002

6 WB IF 2R

0.985

0.980

0.975 6 WB IF 2L

0.990

0.985

0.980 7 ON IF 1R

0.994 0.992 0.990 0.988 0.986 0.984 7 ON IF 1L

Gain

1.048 1.046 1.044 1.042 1.040 7 ON IF 2R

0.99

0.98

0.97 7 ON IF 2L

1.046 1.044 1.042 1.040 1.038

8 SC IF 1R

1.01 1.00 0.99

8 SC IF 1L

TIME (HOURS)

19 52 53 54 55 56 57 58 59 20 00 01

1.02

1.00

0.98

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 05-OCT-2004 17:51:33

8 SC IF 2R

1.04

1.02

1.00

8 SC IF 2L

1.02 1.01 1.00 0.99

9 HN IF 1R

0.99 0.98 0.97 0.96

9 HN IF 1L

1.06

1.04

1.02

9 HN IF 2R

1.00 0.99 0.98 0.97

9 HN IF 2L

Gain

1.05 1.04 1.03 1.02

10 NL IF 1R

1.005 1.000 0.995 0.990 0.985 10 NL IF 1L

1.04 1.02 1.00 0.98

10 NL IF 2R

1.04 1.03 1.02 1.01

10 NL IF 2L

TIME (HOURS)

19 52 53 54 55 56 57 58 59 20 00 01

1.07 1.06 1.05 1.04 1.03

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 5 created 05-OCT-2004 17:51:33

11 FD IF 1R

1.01

1.00

0.99

11 FD IF 1L

1.08 1.06 1.04 1.02

11 FD IF 2R

1.025 1.020 1.015

11 FD IF 2L

1.11

1.10

1.09

12 LA IF 1R

1.05

1.04

1.03

12 LA IF 1L

Gain

1.12 1.10 1.08 1.06

12 LA IF 2R

1.050 1.045 1.040

12 LA IF 2L

1.06

1.05

1.04

13 PT IF 1R

1.005 1.000 0.995 0.990 0.985

13 PT IF 1L

TIME (HOURS)

19 52 53 54 55 56 57 58 59 20 00 01

1.04 1.02 1.00

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 6 created 05-OCT-2004 17:51:33

13 PT IF 2R

0.985 0.980 0.975 0.970

13 PT IF 2L

1.030 1.025 1.020 1.015

14 KP IF 1R

1.02

1.00

0.98

14 KP IF 1L

1.04 1.02 1.00 0.98

14 KP IF 2R

1.01

1.00

0.99

14 KP IF 2L

Gain

0.995 0.990 0.985 0.980 0.975

15 OV IF 1R

1.010 1.005 1.000 0.995

15 OV IF 1L

1.08 1.06 1.04 1.02 1.00

15 OV IF 2R

1.100 1.095 1.090 1.085

15 OV IF 2L

TIME (HOURS)

19 52 53 54 55 56 57 58 59 20 00 01

0.84 0.83 0.82 0.81

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 7 created 05-OCT-2004 17:51:33

16 BR IF 1R

1.26 1.24 1.22 1.20 1.18 1.16

16 BR IF 1L

1.02 1.01 1.00 0.99

16 BR IF 2R

1.08 1.07 1.06 1.05

16 BR IF 2L

Gain

TIME (HOURS)

19 52 53 54 55 56 57 58 59 20 00 01

1.04

1.02

1.00