Center at RA 09 27 03.01420 DEC 39 02 20.8500

CONT: 4C39.25 IPOL 1665.365 MHZ 4C39.25.ICL001.5

PLot file version 1 created 05-OCT-2004 17:52:10

Cont peak flux = 2.7442E+00 JY/BEAM Levs = 2.744E+00 * (-0.005, 0.005, 0.010, 0.021, 0.041, 0.082, 0.164, 0.328, 0.656)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250