Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 05-OCT-2004 17:51:11

1 EF IF 1R

1.03

1.02

1.01

1 EF IF 1L

1.005 1.000 0.995 0.990

1 EF IF 2R

1.025 1.020 1.015 1.010 1.005

1 EF IF 2L

1.005 1.000 0.995 0.990 0.985

2 JB IF 1R

1.025 1.020 1.015 1.010 1.005

2 JB IF 1L

Gain

0.975 0.970 0.965 0.960 0.955

2 JB IF 2R

0.855 0.850 0.845 0.840 0.835

2 JB IF 2L

1.22

1.21

1.20

3 MC IF 1R

1.035

1.030

1.025

3 MC IF 1L

TIME (HOURS)

1/03 56 57 58 59 1/04 00 01 02 03 04 05

1.005 1.000 0.995

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 05-OCT-2004 17:51:11

3 MC IF 2R

1.050

1.045

1.040 3 MC IF 2L

1.01

1.00

0.99

4 NT IF 1R

1.20

1.19

1.18

4 NT IF 1L

0.98

0.97

0.96

4 NT IF 2R

0.97

0.96

0.95

4 NT IF 2L

Gain

1.015 1.010 1.005 1.000 0.995

5 TR IF 1R

0.47

0.46

0.45

5 TR IF 1L

0.412 0.410 0.408 0.406 0.404 0.402 5 TR IF 2R

0.43 0.42 0.41

5 TR IF 2L

TIME (HOURS)

1/03 56 57 58 59 1/04 00 01 02 03 04 05

0.42

0.41

0.40

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 05-OCT-2004 17:51:11

6 WB IF 1R

1.015 1.010 1.005 1.000 0.995

6 WB IF 1L

1.02

1.01

1.00 6 WB IF 2R

1.00

0.99

0.98

6 WB IF 2L

1.000 0.995 0.990 0.985

7 ON IF 1R

0.980

0.975

0.970 7 ON IF 1L

Gain

1.035 1.030 1.025 1.020 7 ON IF 2R

0.970

0.965

0.960 7 ON IF 2L

1.025

1.020

1.015

8 SC IF 1R

1.045 1.040 1.035 1.030 1.025

8 SC IF 1L

TIME (HOURS)

1/03 56 57 58 59 1/04 00 01 02 03 04 05

1.06 1.04 1.02 1.00

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 05-OCT-2004 17:51:11

8 SC IF 2R

0.990 0.985 0.980 0.975 8 SC IF 2L

0.98

0.96

0.94

9 HN IF 1R 1.2 1.1 1.0 0.9 9 HN IF 1L 1.2 1.1 1.0 9 HN IF 2R 1.2 1.1 1.0 0.9 9 HN IF 2L

Gain

1.2 1.1 1.0 10 NL IF 1R

1.000 0.995 0.990

10 NL IF 1L

0.980 0.975 0.970 10 NL IF 2R

1.02

1.01

1.00

10 NL IF 2L

TIME (HOURS)

1/03 56 57 58 59 1/04 00 01 02 03 04 05

1.035 1.030 1.025 1.020 1.015

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 5 created 05-OCT-2004 17:51:11

11 FD IF 1R

1.01 1.00 0.99 0.98

11 FD IF 1L

1.06

1.04

1.02

11 FD IF 2R

1.010 1.005 1.000

11 FD IF 2L

1.075 1.070 1.065 1.060 1.055

12 LA IF 1R

1.018 1.016 1.014 1.012 1.010 1.008

12 LA IF 1L

Gain

1.040

1.035

1.030

12 LA IF 2R

1.055 1.050 1.045 1.040 1.035

12 LA IF 2L

1.050 1.045 1.040 1.035

13 PT IF 1R

1.00

0.99

0.98

13 PT IF 1L

TIME (HOURS)

1/03 56 57 58 59 1/04 00 01 02 03 04 05

0.985 0.980 0.975 0.970

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 6 created 05-OCT-2004 17:51:11

13 PT IF 2R

0.980 0.975 0.970 0.965

13 PT IF 2L

1.02

1.01

1.00

14 KP IF 1R

1.06 1.04 1.02 1.00

14 KP IF 1L

1.04 1.02 1.00 0.98

14 KP IF 2R

1.08 1.06 1.04 1.02 1.00

14 KP IF 2L

Gain

1.06 1.04 1.02 1.00 0.98

15 OV IF 1R

1.04 1.02 1.00 0.98

15 OV IF 1L

1.02

1.00

0.98

15 OV IF 2R

1.10

1.09

1.08

15 OV IF 2L

TIME (HOURS)

1/03 56 57 58 59 1/04 00 01 02 03 04 05

0.80 0.79 0.78

Gain amp vs UTC time for J1740+5211.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 7 created 05-OCT-2004 17:51:11

16 BR IF 1R

1.12 1.11 1.10

16 BR IF 1L

0.95 0.94 0.93

16 BR IF 2R

1.025 1.020 1.015

16 BR IF 2L

Gain

TIME (HOURS)

1/03 56 57 58 59 1/04 00 01 02 03 04 05

0.99 0.98 0.97