Plot file version 1 created 09-APR-2004 07:56:51 Amplitude vs UV dist for J1048+2115.MULTI.1 Source:J1048+2115 Ants * - * Stokes I IF# 1 - 4 Chan# 1

Freq = 8.4055 GHz, Bw = 8.000 MHz

Janskys

Mega Wavlngth

0 50 100 150 200 250 300

200

180

160

140

120

100

80

60

40

20

0