Center at RA 10 51 48.78907 DEC 21 19 52.3141

CONT: J1051+21 IPOL 8420.396 MHZ J1051+2119.IIM001.2

PLot file version 1 created 08-APR-2004 13:18:26

Cont peak flux = 4.9047E-01 JY/BEAM Levs = 4.905E-01 * (-0.039, 0.039, 0.078, 0.156, 0.312, 0.625)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50