Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 09-APR-2003 14:44:25

1R EB

1.10 1.05 1.00 0.95 2R CM 1.3 1.2 1.1 4R MC 400 200 0 6R WB

1.10 1.05 1.00

7R GB

1.10 1.05 1.00 0.95 8R SC

Gain

5 4 3 2 1 10R NL

1.00 0.98 0.96 0.94 11R FD

1.05 1.00 0.95 0.90

12R LA

1.05 1.00 0.95 0.90

13R PT

TIME (HOURS)

16 20 1/00 1/04 1/08 1/12

1.00 0.95 0.90

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 09-APR-2003 14:44:25

15R OV 1.1 1.0 0.9 16R BR

1.05 1.00 0.95 0.90 17R MK 1.4 1.2 1.0 18R YY

Gain

TIME (HOURS)

16 20 1/00 1/04 1/08 1/12

1.4 1.3 1.2 1.1

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 09-APR-2003 14:45:04

1R EB

1000 990 980 2R CM

1100

1050

1000

4R MC

1000 980 960 7R GB 1000 995 8R SC

1000 980 960 940 10R NL

MilliGain

980 960 940 11R FD 990 980 970 960 950 12R LA 950 940 930 920 910 13R PT 960 940 920 900 15R OV

TIME (HOURS)

1/03 26 27 28 29 30 31 32 33 34 35

980 960 940 920 900

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 09-APR-2003 14:45:04

16R BR 980 960 940 920 18R YY

MilliGain

TIME (HOURS)

1/03 26 27 28 29 30 31 32 33 34 35

995 990

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 09-APR-2003 14:45:31

1R EB 1.1 1.0 0.9 2R CM 1.4 1.2 1.0 4R MC 1.2 1.1 1.0 0.9 6R WB 1.0 0.9 0.8 7R GB

1.05 1.00 0.95

8R SC

Gain

1.00 0.98 0.96 0.94

10R NL

0.94 0.92 0.90 0.88

11R FD

1.00 0.95 0.90

12R LA

1.00 0.98 0.96 0.94 0.92

13R PT

TIME (HOURS)

16 17 18 19 20 21 22 23 1/00 1/01

1.05 1.00 0.95 0.90

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 09-APR-2003 14:45:31

15R OV

1.00 0.95 0.90

16R BR

1.00 0.95 0.90 0.85

17R MK 5 4 3 2 1 18R YY

Gain

TIME (HOURS)

16 17 18 19 20 21 22 23 1/00 1/01

1.06 1.05 1.04 1.03