Tsys vs UTC time for ig002b.MSORT.1 TY 1 Rpol & Lpol IF 1

Plot file version 1 created 13-MAR-2005 16:09:59

1R JB 1.005 1.000 0.995

1L JB 1.005 1.000 0.995

2R CM 1.005 1.000 0.995

2L CM 1.005 1.000 0.995

3R WB 1.005 1.000 0.995

3L WB

Kelvin

1.005 1.000 0.995

4R ON 1.005 1.000 0.995

4L ON 1.005 1.000 0.995

5R TR 1.005 1.000 0.995

5L TR

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30 16 00

1.005 1.000 0.995

Tsys vs UTC time for ig002b.MSORT.1 TY 1 Rpol & Lpol IF 1

Plot file version 2 created 13-MAR-2005 16:09:59

6R AR 1.005 1.000 0.995

6L AR

Kelvin

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30 16 00

1.005 1.000 0.995