Center at RA 01 02 45.76239 DEC 58 24 11.1366

0059+581 IPOL 4988.459 MHZ 0059+581.ICL001.13

PLot file version 1 created 18-MAR-2001 17:06:58

Peak flux = 1.0219E+00 JY/BEAM Levs = 1.022E+00 * (-0.002, 0.002, 0.004, 0.008, 0.016, 0.032, 0.064, 0.128, 0.255, 0.510)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50