Gain amp vs UTC time for 0059+581.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 12-MAR-2001 13:31:58

1R EF

1000 980 960 940 920 2R MC 950 900 850 800 3R NT

1200

1100

1000

4R ON

1300 1200 1100 1000 900 5R TR

1000 950 900 850 7R JB

MilliGain

1400 1350 1300 1250

8R WB

1300 1200 1100 1000 900 10R CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

1300 1200 1100 1000

Gain amp vs UTC time for 0059+581.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 12-MAR-2001 13:31:59

1R EF

0.98 0.96 0.94 0.92 0.90

2R MC 1.4 1.2 1.0 0.8 0.6 3R NT

0.95 0.90 0.85

4R ON 1.3 1.2 1.1 1.0 0.9 5R TR

0.98 0.96 0.94 0.92 0.90 0.88 7R JB

Gain

1.15 1.10 1.05 1.00

8R WB 1.4 1.2 1.0 10R CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

1.2 1.1 1.0

Gain amp vs UTC time for 0059+581.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 12-MAR-2001 13:31:59

1L EF

1000 980 960 940 920 2L MC

1000 900 800 3L NT

1350 1300 1250 1200 1150 4L ON

1300 1200 1100 1000 900 5L TR

1100 1050 1000

7L JB

MilliGain

1100 1050 1000

8L WB

1400 1200 1000 800 10L CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

1300 1200 1100

Gain amp vs UTC time for 0059+581.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 12-MAR-2001 13:32:00

1L EF

1020 1000 980 960 940 920 2L MC

1000 900 800 700 3L NT

1200

1100

1000 4L ON

1200 1000 800 5L TR 1000 950 900 7L JB

MilliGain

1200 1100 1000

8L WB

1400 1200 1000

10L CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

1200 1100 1000