Gain amp vs UTC time for n01c1.MSORT.1 CL 2 Rpol IF 1

Plot file version 1 created 12-MAR-2001 12:12:18

1R EF

4.32 4.30 4.28 4.26 4.24

2R MC

19.4 19.2 19.0 18.8 18.6 18.4

3R NT

16.4

16.2

16.0

4R ON 70 60 50 40 5R TR

16.5 16.0 15.5 15.0

7R JB

Gain

16.6

16.4

16.2

8R WB 10 9 8 10R CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

11.670 11.665 11.660 11.655

Gain amp vs UTC time for n01c1.MSORT.1 CL 2 Rpol IF 2

Plot file version 2 created 12-MAR-2001 12:12:18

1R EF

4.35

4.30

4.25

2R MC 35 30 25 20 3R NT

16.3 16.2 16.1 16.0 15.9

4R ON 70 60 50 40 5R TR

15.6 15.4 15.2 15.0 14.8 7R JB

Gain

17.4 17.2 17.0 16.8 8R WB 9.0 8.5 8.0 10R CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

11.670 11.665 11.660 11.655

Gain amp vs UTC time for n01c1.MSORT.1 CL 2 Lpol IF 1

Plot file version 3 created 12-MAR-2001 12:12:18

1L EF

4.32 4.30 4.28 4.26

2L MC

19.0 18.8 18.6 18.4 18.2

3L NT

15.5 15.4 15.3 15.2

4L ON 70 60 50 40 5L TR

13.0 12.8 12.6

7L JB

Gain

15.8

15.6

15.4

8L WB 10 9 8 10L CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

11.670 11.665 11.660 11.655

Gain amp vs UTC time for n01c1.MSORT.1 CL 2 Lpol IF 2

Plot file version 4 created 12-MAR-2001 12:12:19

1L EF

4.30 4.28 4.26 4.24

2L MC 26 24 22 20 18 3L NT

16.85 16.80 16.75 16.70

4L ON 70 60 50 40 5L TR

14.0 13.8 13.6 13.4 13.2

7L JB

Gain

16.0 15.8

15.6

8L WB 9.0 8.5 8.0 10L CM

TIME (HOURS)

12 30 13 00 30 14 00 30 15 00 30

11.670 11.665 11.660 11.655