Center at RA 01 02 45.76239 DEC 58 24 11.1366

CONT: 0059+581 IPOL 1656.459 MHZ 0059+581.ICL001.7

PLot file version 1 created 09-APR-2001 16:19:26

Cont peak flux = 5.4299E-01 JY/BEAM Levs = 5.430E-01 * (-0.002, 0.002, 0.004, 0.007, 0.015, 0.029, 0.058, 0.117, 0.234, 0.468, 0.935)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

50

0

-50

-100