Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 03-JUL-2001 11:23:46

1R EF 1.1 1.0 0.9 0.8 2R WB 5 4 3 2 1 3R NT 1.4 1.2 1.0 5R MC 1.4 1.2 1.0 0.8 6R YB 1.1 1.0 0.9 8R SH

Gain

5 4 3 2 1 9R RO 0.8 0.6 0.4 10R WZ

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

1.0 0.8 0.6

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 03-JUL-2001 11:23:47

1R EF 1.1 1.0 0.9 2R WB 6 4 2 3R NT 1.1 1.0 0.9 5R MC 1.6 1.4 1.2 1.0 0.8 6R YB

1.15 1.10 1.05 1.00 0.95

8R SH

Gain

1.1 1.0 0.9 0.8 0.7 9R RO 1.0 0.8 0.6 10R WZ

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

0.85 0.80 0.75 0.70 0.65

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 03-JUL-2001 11:23:47

1R EF 1.2 1.1 1.0 0.9 2R WB 100 50 0 3R NT 1.1 1.0 0.9 0.8 5R MC 1.2 1.0 0.8 6R YB

1.10 1.05 1.00 0.95

8R SH

Gain

1.2 1.0 0.8 9R RO

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00

1.0 0.8 0.6 0.4

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 03-JUL-2001 11:23:48

1R EF

1.00 0.95 0.90 0.85

2R WB 2.0 1.5 1.0 3R NT

0.95 0.90 0.85 0.80 0.75

5R MC 1.2 1.1 1.0 0.9 6R YB 1.2 1.1 1.0 8R SH

Gain

1.2 1.0 0.8 9R RO

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

1.0 0.8 0.6 0.4