Gain amp vs UTC time for n01x2.MSORT.1 CL 4 Rpol IF 1

Plot file version 8 created 03-JUL-2001 11:35:38

1R EF 9 8 7 6 2R WB 100 80 60 40 20 3R NT 45 40 35 30 5R MC 25 20 15 6R YB 65 60 55 8R SH

Gain

60 40 20 9R RO 14 12 10 8 10R WZ

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

50 40 30

Gain amp vs UTC time for n01x2.MSORT.1 CL 4 Rpol IF 2

Plot file version 9 created 03-JUL-2001 11:35:39

1R EF 9 8 7 6 2R WB 120 100 80 60 40 20 3R NT 38 36 34 32 30 5R MC 25 20 15 6R YB 65 60 55 8R SH

Gain

14 12 10 8 9R RO 14 12 10 8 10R WZ

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

50 40 30

Gain amp vs UTC time for n01x2.MSORT.1 CL 4 Rpol IF 3

Plot file version 10 created 03-JUL-2001 11:35:40

1R EF

0.008

0.007

0.006

2R WB 2 1 0 3R NT

0.034 0.032 0.030 0.028 0.026

5R MC

0.020 0.018 0.016 0.014

6R YB

0.062 0.060 0.058 0.056 0.054

8R SH

Kilo Gain

0.013 0.012 0.011 0.010 0.009

9R RO

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

0.012 0.010 0.008 0.006

Gain amp vs UTC time for n01x2.MSORT.1 CL 4 Rpol IF 4

Plot file version 11 created 03-JUL-2001 11:35:41

1R EF 9 8 7 6 2R WB 35 30 25 20 3R NT 32 30 28 26 24 5R MC 20 18 16 6R YB 70 65 60 55 8R SH

Gain

14 12 10 8 9R RO

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

14 12 10 8