Tsys vs UTC time for n01x2.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 1 created 28-JUN-2001 14:30:56

1R EF IF 1 120 100 80 60 1R EF IF 2 120 100 80 60 1R EF IF 3 120 100 80 60 1R EF IF 4 120 100 80 60 2R WB IF 1 700 600 500 400 300 2R WB IF 2

Kelvin

700 600 500 400 300 2R WB IF 3 700 600 500 400 300 2R WB IF 4 700 600 500 400 300 3R NT IF 1 134 132 130 128 3R NT IF 2

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

155 150 145 140 135

Tsys vs UTC time for n01x2.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 2 created 28-JUN-2001 14:30:56

3R NT IF 3 127 126 125 124 3R NT IF 4 150 148 146 144 4R ON IF 1 150 100 50 4R ON IF 2 150 100 50 4R ON IF 3 100 80 60 40 4R ON IF 4

Kelvin

100 80 60 40 5R MC IF 1 48 47 46 45 5R MC IF 2 47 46 45 44 5R MC IF 3 45 44 43 5R MC IF 4

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

45 44 43 42

Tsys vs UTC time for n01x2.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 3 created 28-JUN-2001 14:30:56

6R YB IF 1 91 90 89 6R YB IF 2 84 83 82 6R YB IF 3 86 85 84 6R YB IF 4 85 84 83 7R UR IF 1 400 300 200 100 7R UR IF 2

Kelvin

400 300 200 100 7R UR IF 3 300 200 100 7R UR IF 4 400 300 200 100 8R SH IF 1 80 70 60 8R SH IF 2

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

80 70 60

Tsys vs UTC time for n01x2.MSORT.1 TY 1 Rpol IF 1 - 4

Plot file version 4 created 28-JUN-2001 14:30:56

8R SH IF 3 80 70 60 8R SH IF 4 80 70 60 9R RO IF 1 400 300 200 9R RO IF 2 400 300 200 9R RO IF 3 400 300 200 9R RO IF 4

Kelvin

400 300 200 10R WZ IF 1 120 100 80 60 40 10R WZ IF 2 120 100 80 60 40 10R WZ IF 3 140 120 100 80 60 40 10R WZ IF 4

TIME (HOURS)

08 30 09 00 30 10 00 30 11 00 30 12 00 30

150 100 50