Center at RA 06 07 23.25498 DEC 47 39 46.9422

CONT: J0607+47 IPOL 4990.021 MHZ J0607+4739.ICL001.3

PLot file version 1 created 27-AUG-2002 14:58:04

Cont peak flux = 4.8394E-01 JY/BEAM Levs = 4.839E-01 * (-0.017, 0.017, 0.034, 0.068, 0.135, 0.271, 0.542, 1.084, 2.168, 4.336, 8.672, 17.34, 34.69, 69.37, 138.7)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100