Center at RA 06 12 51.18522 DEC 41 22 37.4081

CONT: J0612+41 IPOL 4990.021 MHZ J0612+4122.ICL001.3

PLot file version 1 created 27-AUG-2002 15:00:53

Cont peak flux = 1.6046E-01 JY/BEAM Levs = 1.605E-01 * (-0.018, 0.018, 0.037, 0.073, 0.147, 0.293, 0.586, 1.173, 2.345, 4.691, 9.381, 18.76, 37.52, 75.05, 150.1)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100