Center at RA 06 25 18.26539 DEC 44 40 01.6262

CONT: J0625+44 IPOL 4990.021 MHZ J0625+4440.ICL001.3

PLot file version 1 created 27-AUG-2002 15:03:25

Cont peak flux = 2.0173E-01 JY/BEAM Levs = 2.017E-01 * (-0.018, 0.018, 0.036, 0.072, 0.144, 0.289, 0.577, 1.155, 2.309, 4.618, 9.236, 18.47, 36.95, 73.89, 147.8)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100