Center at RA 22 53 57.74793 DEC 16 08 53.5609

CONT: J2253+16 IPOL 4990.021 MHZ J2253+1608.ICL001.3

PLot file version 1 created 27-AUG-2002 15:06:13

Cont peak flux = 3.8353E+00 JY/BEAM Levs = 3.835E+00 * (-0.082, 0.082, 0.165, 0.330, 0.660, 1.320, 2.640, 5.279, 10.56, 21.12, 42.23, 84.47, 168.9, 337.9, 675.7)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100