Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 1 created 23-AUG-2002 11:23:38

1R EF IF 1 40 35 30 1R EF IF 2 40 35 30 1R EF IF 3 40 35 30 1R EF IF 4 40 35 30 1R EF IF 5 40 35 30 1R EF IF 6

Kelvin

40 35 30 1R EF IF 7 40 35 30 1R EF IF 8 40 35 30 2R MC IF 1 70 60 50 2R MC IF 2

TIME (HOURS)

09 00 30 10 00 30 11 00 30

70 60 50

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 2 created 23-AUG-2002 11:23:38

2R MC IF 3 70 60 50 2R MC IF 4 70 60 50 2R MC IF 5 70 60 50 2R MC IF 6 70 60 50 2R MC IF 7 70 60 50 2R MC IF 8

Kelvin

70 60 50 3R WB IF 1 200 150 100 50 3R WB IF 2 200 150 100 50 3R WB IF 3 200 150 100 50 3R WB IF 4

TIME (HOURS)

09 00 30 10 00 30 11 00 30

200 150 100 50

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 3 created 23-AUG-2002 11:23:38

3R WB IF 5 200 150 100 50 3R WB IF 6 200 150 100 50 3R WB IF 7 200 150 100 50 3R WB IF 8 200 150 100 50 4R ON IF 1 75 70 65 4R ON IF 2

Kelvin

75 70 65 4R ON IF 3 75 70 65 4R ON IF 4 75 70 65 4R ON IF 5 76 7472 70 6866

4R ON IF 6

TIME (HOURS)

09 00 30 10 00 30 11 00 30

7674 72 7068 66

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 4 created 23-AUG-2002 11:23:38

4R ON IF 7 75 70 65 4R ON IF 8 75 70 65 5R TR IF 1 40 35 30 25 5R TR IF 2 40 35 30 25 5R TR IF 3 50 40 30 5R TR IF 4

Kelvin

50 40 30 5R TR IF 5 50 40 30 5R TR IF 6 50 40 30 5R TR IF 7 40 30 20 5R TR IF 8

TIME (HOURS)

09 00 30 10 00 30 11 00 30

40 30 20

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 5 created 23-AUG-2002 11:23:38

7R CM IF 1

1.005 1.000 0.995

7R CM IF 2

1.005 1.000 0.995

7R CM IF 3

1.005 1.000 0.995

7R CM IF 4

1.005 1.000 0.995

7R CM IF 5

1.005 1.000 0.995

7R CM IF 6

Kelvin

1.005 1.000 0.995

7R CM IF 7

1.005 1.000 0.995

7R CM IF 8

1.005 1.000 0.995

8R UR IF 1 160 140 120 8R UR IF 2

TIME (HOURS)

09 00 30 10 00 30 11 00 30

160 140 120

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 6 created 23-AUG-2002 11:23:38

8R UR IF 3 150 140 130 120 8R UR IF 4 150 140 130 120 8R UR IF 5 150 140 130 120 110 8R UR IF 6 150 140 130 120 110 8R UR IF 7 150 140 130 120 8R UR IF 8

Kelvin

150 140 130 120 10R NT IF 1 65 60 55 50 45 10R NT IF 2 65 60 55 50 45 10R NT IF 3 65 60 55 50 45 10R NT IF 4

TIME (HOURS)

09 00 30 10 00 30 11 00 30

65 60 55 50 45

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 7 created 23-AUG-2002 11:23:38

10R NT IF 5 65 60 55 50 10R NT IF 6 65 60 55 50 10R NT IF 7 60 55 50 45 10R NT IF 8 60 55 50 45 11R HH IF 1 70 60 50 11R HH IF 2

Kelvin

70 60 50 11R HH IF 3 80 70 60 50 11R HH IF 4 80 70 60 50 11R HH IF 5 70 60 50 11R HH IF 6

TIME (HOURS)

09 00 30 10 00 30 11 00 30

70 60 50

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Rpol IF 1 - 8

Plot file version 8 created 23-AUG-2002 11:23:38

11R HH IF 7 100 80 60 11R HH IF 8 100 80 60 12R AR IF 1

6.01

6.00

5.99

12R AR IF 2

6.01

6.00

5.99

12R AR IF 3

6.01

6.00

5.99

12R AR IF 4

Kelvin

6.01

6.00

5.99

12R AR IF 5

6.01

6.00

5.99

12R AR IF 6

6.01

6.00

5.99

12R AR IF 7

6.01

6.00

5.99

12R AR IF 8

TIME (HOURS)

09 00 30 10 00 30 11 00 30

6.01

6.00

5.99

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Lpol IF 1 - 8

Plot file version 9 created 23-AUG-2002 11:23:38

1L EF IF 1 40 35 30 1L EF IF 2 40 35 30 1L EF IF 3 40 35 30 1L EF IF 4 40 35 30 1L EF IF 5

3836 3432 3028

1L EF IF 6

Kelvin

3836 3432 3028

1L EF IF 7 40 35 30 1L EF IF 8 40 35 30 2L MC IF 1 70 60 50 2L MC IF 2

TIME (HOURS)

09 00 30 10 00 30 11 00 30

70 60 50

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Lpol IF 1 - 8

Plot file version 10 created 23-AUG-2002 11:23:39

2L MC IF 3 70 60 50 2L MC IF 4 70 60 50 2L MC IF 5 65 60 55 50 45 2L MC IF 6 65 60 55 50 45 2L MC IF 7 65 60 55 50 45 2L MC IF 8

Kelvin

65 60 55 50 45 3L WB IF 1 200 150 100 50 3L WB IF 2 200 150 100 50 3L WB IF 3 200 150 100 50 3L WB IF 4

TIME (HOURS)

09 00 30 10 00 30 11 00 30

200 150 100 50

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Lpol IF 1 - 8

Plot file version 11 created 23-AUG-2002 11:23:39

3L WB IF 5 200 150 100 50 3L WB IF 6 200 150 100 50 3L WB IF 7 200 150 100 50 3L WB IF 8 200 150 100 50 4L ON IF 1 65 60 4L ON IF 2

Kelvin

65 60 4L ON IF 3 66 64 62 60 58 56 4L ON IF 4 66 64 62 60 58 56 4L ON IF 5

7270 6866 6462

4L ON IF 6

TIME (HOURS)

09 00 30 10 00 30 11 00 30

7270 6866 6462

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Lpol IF 1 - 8

Plot file version 12 created 23-AUG-2002 11:23:39

4L ON IF 7 65 60 55 4L ON IF 8 65 60 55 5L TR IF 1 60 50 40 30 5L TR IF 2 60 50 40 30 5L TR IF 3 70 60 50 40 5L TR IF 4

Kelvin

70 60 50 40 5L TR IF 5 70 60 50 40 5L TR IF 6 70 60 50 40 5L TR IF 7 50 40 30 5L TR IF 8

TIME (HOURS)

09 00 30 10 00 30 11 00 30

50 40 30

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Lpol IF 1 - 8

Plot file version 15 created 23-AUG-2002 11:23:39

9L SH IF 5 65 60 55 50 45 9L SH IF 6 65 60 55 50 45 9L SH IF 7 54 52 50 48 46 44 9L SH IF 8 54 52 50 48 46 44 10L NT IF 1 75 70 65 60 55 10L NT IF 2

Kelvin

75 70 65 60 55 10L NT IF 3 70 65 60 55 10L NT IF 4 70 65 60 55 10L NT IF 5 65 60 55 50 10L NT IF 6

TIME (HOURS)

09 00 30 10 00 30 11 00 30

65 60 55 50

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Lpol IF 1 - 8

Plot file version 16 created 23-AUG-2002 11:23:39

10L NT IF 7 60 55 50 45 10L NT IF 8 60 55 50 45 11L HH IF 1 60 40 20 11L HH IF 2 60 40 20 11L HH IF 3 70 60 50 40 30 11L HH IF 4

Kelvin

70 60 50 40 30 11L HH IF 5 80 60 40 11L HH IF 6 80 60 40 11L HH IF 7 70 60 50 40 30 11L HH IF 8

TIME (HOURS)

09 00 30 10 00 30 11 00 30

70 60 50 40 30

Tsys vs UTC time for n02c1.VBGLU.1 TY 1 Lpol IF 1 - 8

Plot file version 17 created 23-AUG-2002 11:23:39

12L AR IF 1

6.01 6.00 5.99 12L AR IF 2

6.01 6.00 5.99 12L AR IF 3

6.01 6.00 5.99 12L AR IF 4

6.01 6.00 5.99 12L AR IF 5

6.01 6.00 5.99 12L AR IF 6

Kelvin

6.01 6.00 5.99 12L AR IF 7

6.01 6.00 5.99 12L AR IF 8

TIME (HOURS)

09 00 30 10 00 30 11 00 30

6.01 6.00 5.99