Center at RA 11 59 31.83391 DEC 29 14 43.8269

CONT: J1159+29 IPOL 1658.021 MHZ J1159+2914.ICL001.3

PLot file version 1 created 26-APR-2002 12:14:04

Cont peak flux = 1.0777E+00 JY/BEAM Levs = 1.078E+00 * (-0.037, 0.037, 0.074, 0.149, 0.298, 0.595)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

50

0

-50

-100