Center at RA 06 05 50.85535 DEC 40 30 08.1030

CONT: J0605+40 IPOL 1658.021 MHZ J0605+4030.ICL001.3

PLot file version 1 created 29-AUG-2002 13:13:37

Cont peak flux = 6.4101E-01 JY/BEAM Levs = 6.410E-01 * (-0.012, 0.012, 0.024, 0.047, 0.094, 0.189, 0.378, 0.755)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250