Center at RA 11 57 17.72668 DEC 30 42 00.4798

CONT: FIRST 05 IPOL 1646.021 MHZ FIRST 051.ICL001.1

PLot file version 1 created 31-JAN-2003 15:20:34

Cont peak flux = 4.3110E-03 JY/BEAM Levs = 4.311E-03 * (-0.037, 0.037, 0.075, 0.150, 0.300, 0.599)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250