Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 1

Plot file version 55 created 28-JAN-2003 14:33:46

1R EF 0.1 0.0 -0.1

3R WB 14 12 10 8 6 4R ON -11 -12 -13 -14 -15 9R SH 20 10 0 -10 10R HH 10 0 -10 -20 11R AR

Nano Seconds

TIME (HOURS)

05 00 30 06 00 30 07 00 30

-14.5 -15.0 -15.5

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 2

Plot file version 56 created 28-JAN-2003 14:33:47

1R EF 0.000

3R WB

0.035 0.030 0.025

4R ON

-0.008 -0.010 -0.012 -0.014 5R TR

9R SH

0.03 0.02 0.01

10R HH

MicroSeconds

0.01 0.00 -0.01

11R AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

-0.008

-0.009

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 3

Plot file version 57 created 28-JAN-2003 14:33:47

1R EF

0.05 0.00 -0.05

3R WB

2826 2422 2018

4R ON -13 -14 -15 9R SH 30 20 10 0 10R HH 10 0 -10 -20 11R AR

Nano Seconds

TIME (HOURS)

05 00 30 06 00 30 07 00 30

-20 -21 -22

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 4

Plot file version 58 created 28-JAN-2003 14:33:47

1R EF 0.1 0.0 -0.1

3R WB -2 -4 -6 -8 -10 4R ON -2 -4 -6 -8 8R UR

812.30 812.25 812.20 812.15

9R SH 30 20 10 10R HH

Nano Seconds

10 0 -10 -20 11R AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

-9 -10 -11

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 5

Plot file version 59 created 28-JAN-2003 14:33:47

1R EF 0.000

3R WB

0.002 0.000 -0.002 -0.004 -0.006 -0.008

4R ON

-0.008

-0.010

-0.012

8R UR

-0.2 -0.4 -0.6 -0.8 -1.0

9R SH

0.03 0.02 0.01

10R HH

MicroSeconds

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.01 0.00 -0.01

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 6

Plot file version 60 created 28-JAN-2003 14:33:48

1R EF 0.000

3R WB

0.024 0.022 0.020 0.018 0.016

4R ON

-0.003 -0.004 -0.005 -0.006

8R UR 1.0 0.5 0.0 -0.5

9R SH

0.04 0.03 0.02 0.01

10R HH

MicroSeconds

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.01 0.00 -0.01

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 7

Plot file version 61 created 28-JAN-2003 14:33:48

1R EF 0.000

3R WB

0.024 0.022 0.020 0.018 0.016

4R ON

-0.008 -0.010 -0.012

5R TR

0.60.4 0.20.0 -0.2-0.4

8R UR 1 0 -1 9R SH

MicroSeconds

0.03 0.02 0.01

10R HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.01 0.00 -0.01

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Rpol IF 8

Plot file version 62 created 28-JAN-2003 14:33:48

1R EF 0.000

3R WB

0.000

-0.005

-0.010

4R ON

-0.008 -0.010 -0.012

5R TR 0.6 0.4 0.2 8R UR 1.0 0.5 0.0 -0.5

9R SH

MicroSeconds

0.04 0.03 0.02 0.01

10R HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.01 0.00 -0.01

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Lpol IF 1

Plot file version 63 created 28-JAN-2003 14:33:48

1L EF 0.1 0.0 -0.1

3L WB 10 5 0 4L ON -1 -2 -3 -4 -5 9L SH 30 20 10 0 10L HH 0 -10 -20 -30 11L AR

Nano Seconds

TIME (HOURS)

05 00 30 06 00 30 07 00 30

2.5 2.0 1.5 1.0

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Lpol IF 2

Plot file version 64 created 28-JAN-2003 14:33:49

1L EF 0.1 0.0 -0.1

3L WB 22 20 18 16 14 4L ON 2 0 -2 5L TR

41.65 41.60 41.55 41.50

9L SH 20 10 0 -10 10L HH

Nano Seconds

10 0 -10 11L AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

3.0 2.5 2.0 1.5

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Lpol IF 3

Plot file version 65 created 28-JAN-2003 14:33:49

1L EF 0.000

3L WB

0.032 0.030 0.028 0.026

4L ON

0.002 0.000 -0.002 -0.004

5L TR 0.5 0.0 -0.5

9L SH

0.02 0.01 0.00 -0.01

10L HH

MicroSeconds

0.00 -0.01 -0.02

11L AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.002

0.001

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Lpol IF 4

Plot file version 66 created 28-JAN-2003 14:33:49

1L EF 0.000

3L WB

0.000 -0.005 -0.010

4L ON

0.000 -0.002 -0.004

5L TR 0.0 -0.5 -1.0 -1.5

7L CM 0.200 0.195

9L SH

MicroSeconds

0.04 0.03 0.02

10L HH

0.00 -0.01 -0.02

11L AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.009 0.008 0.007

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Lpol IF 7

Plot file version 69 created 28-JAN-2003 14:33:50

1L EF 0.000

3L WB

0.022 0.020 0.018 0.016 0.014 4L ON

0.000

-0.002

-0.004 5L TR 1.0 0.5 0.0 -0.5

8L UR 0.5 0.0 -0.5

9L SH

MicroSeconds

0.03 0.02 0.01 0.00

10L HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.01 0.00 -0.01 -0.02

Delay vs UTC time for n02l3.UVAVG.1 SN 2 Lpol IF 8

Plot file version 70 created 28-JAN-2003 14:33:50

1L EF 0.000

3L WB

-0.002 -0.004 -0.006 -0.008

4L ON

0.000 -0.002 -0.004 -0.006 -0.008

5L TR 0.5 0.0 -0.5

8L UR

9L SH

MicroSeconds

0.03 0.02 0.01 0.00

10L HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

0.01 0.00 -0.01