Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 1

Plot file version 55 created 28-JAN-2003 14:33:34

1R EF 40 20 0 -20 -40 3R WB 200 0 -200 4R ON 200 0 -200 9R SH 200 0 -200 10R HH 200 0 -200 11R AR

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 2

Plot file version 56 created 28-JAN-2003 14:33:34

1R EF 40 20 0 -20 -40 3R WB 300 200 100 0 4R ON 300 200 100 0 5R TR 300 200 100 0 9R SH 200 0 -200 10R HH

Degrees

200 0 -200 11R AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

300 200 100 0

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 3

Plot file version 57 created 28-JAN-2003 14:33:35

1R EF 40 20 0 -20 -40 3R WB 200 0 -200 4R ON 200 0 -200 9R SH 200 0 -200 10R HH 200 0 -200 11R AR

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 4

Plot file version 58 created 28-JAN-2003 14:33:35

1R EF 40 20 0 -20 -40 3R WB 200 0 -200 4R ON 200 0 -200 8R UR 300 250 200 9R SH 200 0 -200 10R HH

Degrees

300 200 100 0 11R AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 5

Plot file version 59 created 28-JAN-2003 14:33:35

1R EF 40 20 0 -20 -40 3R WB 300 200 100 0 4R ON 100 50 0 -50 8R UR 200 0 -200

9R SH 300 200 100 0 10R HH

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 6

Plot file version 60 created 28-JAN-2003 14:33:36

1R EF 40 20 0 -20 -40 3R WB 200 0 -200

4R ON 200 0 -200

8R UR 200 0 -200

9R SH 200 0 -200

10R HH

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 7

Plot file version 61 created 28-JAN-2003 14:33:36

1R EF 40 20 0 -20 -40 3R WB 300 200 100 0 4R ON 100 0 -100

5R TR 300 200 100 0 8R UR 200 0 -200

9R SH

Degrees

200 0 -200

10R HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Rpol IF 8

Plot file version 62 created 28-JAN-2003 14:33:36

1R EF 40 20 0 -20 -40 3R WB 300 200 100 0 4R ON 100 0 -100 -200

5R TR 300 200 100 0 8R UR 200 0 -200

9R SH

Degrees

300 200 100 0 10R HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Lpol IF 1

Plot file version 63 created 28-JAN-2003 14:33:36

1L EF 40 20 0 -20 -40 3L WB 300 200 100 0 4L ON 300 200 100 0 9L SH 300 200 100 0 10L HH 300 200 100 0 11L AR

Degrees

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Lpol IF 2

Plot file version 64 created 28-JAN-2003 14:33:37

1L EF 40 20 0 -20 -40 3L WB 300 200 100 0 4L ON 300 200 100 0 5L TR 200 0 -200

9L SH 200 0 -200

10L HH

Degrees

200 0 -200

11L AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

300 200 100 0

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Lpol IF 3

Plot file version 65 created 28-JAN-2003 14:33:37

1L EF 40 20 0 -20 -40 3L WB 300 200 100 0 4L ON 200 0 -200

5L TR 300 200 100 0 9L SH 200 0 -200

10L HH

Degrees

200 0 -200

11L AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

300 200 100 0

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Lpol IF 4

Plot file version 66 created 28-JAN-2003 14:33:37

1L EF 40 20 0 -20 -40 3L WB 200 0 -200

4L ON 200 100 0 -100

5L TR 300 200 100 0 7L CM 300 200 100 0 9L SH

Degrees

200 0 -200

10L HH 200 0 -200

11L AR

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Lpol IF 7

Plot file version 69 created 28-JAN-2003 14:33:38

1L EF 40 20 0 -20 -40 3L WB 300 200 100 0 4L ON 100 0 -100

5L TR 300 200 100 0 8L UR 200 0 -200 9L SH

Degrees

200 0 -200 10L HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200

Gain phs vs UTC time for n02l3.UVAVG.1 CL 3 Lpol IF 8

Plot file version 70 created 28-JAN-2003 14:33:39

1L EF 40 20 0 -20 -40 3L WB 200 0 -200 4L ON 200 0 -200 5L TR 300 200 100 0 8L UR

-146 -148 -150

9L SH

Degrees

200 0 -200 10L HH

TIME (HOURS)

05 00 30 06 00 30 07 00 30

200 0 -200