Center at RA 11 47 59.76389 DEC 26 35 42.3327

CONT: J1147+26 IPOL 1646.021 MHZ J1147+2635.ICL001.1

PLot file version 1 created 31-JAN-2003 15:21:11

Cont peak flux = 4.1017E-01 JY/BEAM Levs = 4.102E-01 * (-0.097, 0.097, 0.195, 0.390, 0.779)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250