Center at RA 11 59 31.83391 DEC 29 14 43.8269

CONT: J1159+29 IPOL 1646.021 MHZ J1159+2914.ICL001.3

PLot file version 1 created 31-JAN-2003 15:19:54

Cont peak flux = 1.7168E+00 JY/BEAM Levs = 1.717E+00 * (-0.004, 0.004, 0.008, 0.016, 0.032, 0.065, 0.129, 0.258, 0.516)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250